From 004ce6f5e23804c55d62ebbff73e57f02360763e Mon Sep 17 00:00:00 2001
From: Peter Bray <illumino@users.sourceforge.net>
Date: Mon, 25 Jul 2005 14:17:48 +0000
Subject: Change the environment variable NPTESTCACHE to NPTEST_CACHE for
 consistancy

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1208 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/NPTest.pm b/NPTest.pm
index f3c874b..201bc6a 100644
--- a/NPTest.pm
+++ b/NPTest.pm
@@ -202,8 +202,8 @@ my( %CACHE ) = ();
 
 # I'm not really sure wether to house a site-specific cache inside
 # or outside of the extracted source / build tree - lets default to outside
-my( $CACHEFILENAME ) = ( exists( $ENV{'NPTESTCACHE'} ) && $ENV{'NPTESTCACHE'} )
-                       ? $ENV{'NPTESTCACHE'} : "/var/tmp/NPTest.cache"; # "../Cache.pdd";
+my( $CACHEFILENAME ) = ( exists( $ENV{'NPTEST_CACHE'} ) && $ENV{'NPTEST_CACHE'} )
+                       ? $ENV{'NPTEST_CACHE'} : "/var/tmp/NPTest.cache"; # "../Cache.pdd";
 
 #
 # Testing Functions
-- 
cgit v0.10-9-g596f

