From 026db39bb756814318ce5f23f2a08b075e8b8a86 Mon Sep 17 00:00:00 2001
From: Thomas Guyot-Sionnest <dermoth@users.sourceforge.net>
Date: Thu, 1 Feb 2007 05:33:07 +0000
Subject: Fix bug #1593073 Check_Log problem with log rotation

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1602 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins-scripts/check_log.sh b/plugins-scripts/check_log.sh
index 38375dd..20c55f4 100755
--- a/plugins-scripts/check_log.sh
+++ b/plugins-scripts/check_log.sh
@@ -197,7 +197,7 @@ else
     $CHMOD 600 $tempdiff
 fi
 
-$DIFF $logfile $oldlog > $tempdiff
+$DIFF $logfile $oldlog | $GREP -v "^>" > $tempdiff
 
 # Count the number of matching log entries we have
 count=`$GREP -c "$query" $tempdiff`
-- 
cgit v0.10-9-g596f

