From 0a5cd15e75d512a9cbb84480b820ee787cbbdcb5 Mon Sep 17 00:00:00 2001
From: Matthias Eble <psychotrahe@gmx.de>
Date: Mon, 1 Jun 2009 22:41:46 +0200
Subject: Fixed check_icmp compiler warnings by including float.h

Self defined DBL_MAX caused compiler warnings. Now float.h
which defines DBL_MAX is included.

diff --git a/plugins-root/check_icmp.c b/plugins-root/check_icmp.c
index 4da6ea1..845fc95 100644
--- a/plugins-root/check_icmp.c
+++ b/plugins-root/check_icmp.c
@@ -70,6 +70,7 @@ const char *email = "nagiosplug-devel@lists.sourceforge.net";
 #include <netinet/ip_icmp.h>
 #include <arpa/inet.h>
 #include <signal.h>
+#include <float.h>
 
 
 /** sometimes undefined system macros (quite a few, actually) **/
-- 
cgit v0.10-9-g596f

