From 140a93ce6bce63df2d70841f2f78aa968ea997d6 Mon Sep 17 00:00:00 2001
From: Thomas Guyot-Sionnest <dermoth@users.sourceforge.net>
Date: Wed, 23 Apr 2008 08:19:13 +0000
Subject: Correct typo and make the --help notes a bit simpler.

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1983 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins/check_radius.c b/plugins/check_radius.c
index 54617f1..ed93787 100644
--- a/plugins/check_radius.c
+++ b/plugins/check_radius.c
@@ -3,7 +3,7 @@
 * Nagios check_radius plugin
 * 
 * License: GPL
-* Copyright (c) 1999-2007 Nagios Plugins Development Team
+* Copyright (c) 1999-2008 Nagios Plugins Development Team
 * 
 * Last Modified: $Date$
 * 
@@ -33,7 +33,7 @@
 
 const char *progname = "check_radius";
 const char *revision = "$Revision$";
-const char *copyright = "2000-2007";
+const char *copyright = "2000-2008";
 const char *email = "nagiosplug-devel@lists.sourceforge.net";
 
 #include "common.h"
@@ -340,9 +340,8 @@ print_help (void)
 	printf ("%s\n", _("The password option presents a substantial security issue because the"));
   printf ("%s\n", _("password can be determined by careful watching of the command line in"));
   printf ("%s\n", _("a process listing.  This risk is exacerbated because nagios will"));
-  printf ("%s\n", _("run the plugin at regular prdictable intervals.  Please be sure that"));
-  printf ("%s\n", _("the password used does not allow access to sensitive system resources,"));
-  printf ("%s\n", _("otherwise compormise could occur."));
+  printf ("%s\n", _("run the plugin at regular predictable intervals.  Please be sure that"));
+  printf ("%s\n", _("the password used does not allow access to sensitive system resources."));
 
 	printf (_(UT_SUPPORT));
 }
-- 
cgit v0.10-9-g596f

