From 14dd02c058bc34b7b47c31556b7cacaa4ea0942b Mon Sep 17 00:00:00 2001
From: Matthias Eble <psychotrahe@users.sourceforge.net>
Date: Sat, 28 Apr 2007 21:57:17 +0000
Subject: added test cases for check_cluster

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1702 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins/t/check_cluster.t b/plugins/t/check_cluster.t
new file mode 100644
index 0000000..f3e78b8
--- /dev/null
+++ b/plugins/t/check_cluster.t
@@ -0,0 +1,83 @@
+#! /usr/bin/perl -w -I ..
+#
+# check_cluster tests
+#
+# $Id$
+#
+
+use strict;
+use Test::More tests => 15;
+use NPTest;
+
+my $result;
+
+$result = NPTest->testCmd(
+	"./check_cluster -s -w 0:0 -c 0:0 -d 0,0,0,0"
+	);
+cmp_ok( $result->return_code, '==', 0, "Exit OK if non-ok services are inside critical and warning ranges" );
+like( $result->output, qr/service/i, "Output contains the word 'service' (case insensitive)");
+
+$result = NPTest->testCmd(
+	"./check_cluster -l LABEL -s -w 0:0 -c 0:0 -d 0,0,0,0"
+	);
+like( $result->output, qr/LABEL/, "Output contains the defined label 'LABEL' (case sensitive)");
+
+$result = NPTest->testCmd(
+	"./check_cluster -s -w 0:0 -c 0:1 -d 0,0,0,1"
+	);
+cmp_ok( $result->return_code, '==', 1, "Exit WARNING if non-ok services are inside critical and outside warning ranges" );
+
+$result = NPTest->testCmd(
+	"./check_cluster -s -w 0:0 -c 0:1 -d 0,0,1,1"
+	);
+cmp_ok( $result->return_code, '==', 2, "Exit CRITICAL if non-ok services are inside critical and outside warning ranges" );
+
+$result = NPTest->testCmd(
+	"./check_cluster -s -w 0 -c 0 -d 0,0,0,0"
+	);
+cmp_ok( $result->return_code, '==', 0, "Exit OK if non-ok services are inside critical and warning (no ranges)" );
+
+$result = NPTest->testCmd(
+	"./check_cluster -s -w 0 -c 1 -d 0,0,1,0"
+	);
+cmp_ok( $result->return_code, '==', 1, "Exit WARNING if number of non-ok services exceed warning (no ranges)" );
+
+$result = NPTest->testCmd(
+	"./check_cluster -s -w 0 -c 1 -d 0,0,1,1"
+	);
+cmp_ok( $result->return_code, '==', 2, "Exit Critical if non-ok services exceed critical warning (no ranges)" );
+
+
+#
+# And for hosts..
+#
+$result = NPTest->testCmd(
+	"./check_cluster -h -w 0:0 -c 0:0 -d 0,0,0,0"
+	);
+cmp_ok( $result->return_code, '==', 0, "Exit OK if non-ok hosts are inside critical and warning ranges" );
+like( $result->output, qr/host/i, "Output contains the word 'host' (case insensitive)");
+
+$result = NPTest->testCmd(
+	"./check_cluster -h -w 0:0 -c 0:1 -d 0,0,0,1"
+	);
+cmp_ok( $result->return_code, '==', 1, "Exit WARNING if non-ok hosts are inside critical and outside warning ranges" );
+
+$result = NPTest->testCmd(
+	"./check_cluster -h -w 0:0 -c 0:1 -d 0,0,1,1"
+	);
+cmp_ok( $result->return_code, '==', 2, "Exit CRITICAL if non-ok hosts are inside critical and outside warning ranges" );
+
+$result = NPTest->testCmd(
+	"./check_cluster -h -w 0 -c 0 -d 0,0,0,0"
+	);
+cmp_ok( $result->return_code, '==', 0, "Exit OK if non-ok hosts are inside critical and warning (no ranges)" );
+
+$result = NPTest->testCmd(
+	"./check_cluster -h -w 0 -c 1 -d 0,0,1,0"
+	);
+cmp_ok( $result->return_code, '==', 1, "Exit WARNING if number of non-ok hosts exceed warning (no ranges)" );
+
+$result = NPTest->testCmd(
+	"./check_cluster -h -w 0 -c 1 -d 0,0,1,1"
+	);
+cmp_ok( $result->return_code, '==', 2, "Exit Critical if non-ok hosts exceed critical warning (no ranges)" );
-- 
cgit v0.10-9-g596f

