From 15a018f87d8f8f6d8723f16feb1cb3d2877c3375 Mon Sep 17 00:00:00 2001
From: Thomas Guyot-Sionnest <dermoth@users.sourceforge.net>
Date: Fri, 18 May 2007 07:17:59 +0000
Subject: Make check_tcp.t compatible with picky web servers.

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1714 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins/t/check_tcp.t b/plugins/t/check_tcp.t
index c38fca7..2914350 100644
--- a/plugins/t/check_tcp.t
+++ b/plugins/t/check_tcp.t
@@ -34,7 +34,7 @@ $t += checkCmd( "./check_tcp $hostname_invalid   -p 80 -wt   0 -ct   0 -to 1", 2
 
 # Need the \r\n to make it more standards compliant with web servers. Need the various quotes
 # so that perl doesn't interpret the \r\n and is passed onto command line correctly
-$t += checkCmd( "./check_tcp $host_tcp_http      -p 80 -E -s ".'"GET /\r\n\r\n"'." -e 'ThisShouldntMatch' -j", 1, $failedExpect );
+$t += checkCmd( "./check_tcp $host_tcp_http      -p 80 -E -s ".'"GET / HTTP/1.1\r\n\r\n"'." -e 'ThisShouldntMatch' -j", 1, $failedExpect );
 
 exit(0) if defined($Test::Harness::VERSION);
 exit($tests - $t);
-- 
cgit v0.10-9-g596f

