From 187f86275426bfb501c7180c48161e1e22af1ef7 Mon Sep 17 00:00:00 2001
From: Ton Voon <tonvoon@users.sourceforge.net>
Date: Sat, 1 Jan 2005 16:15:39 +0000
Subject: Removed old terminate function (Bug 1093491)

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1074 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins/check_smtp.c b/plugins/check_smtp.c
index f4a11e0..3b0e469 100644
--- a/plugins/check_smtp.c
+++ b/plugins/check_smtp.c
@@ -453,8 +453,7 @@ process_arguments (int argc, char **argv)
 				days_till_exp = atoi (optarg);
 				check_cert = TRUE;
 #else
-				terminate (STATE_UNKNOWN,
-						"SSL support not available.  Install OpenSSL and recompile.");
+				usage (_("SSL support not available - install OpenSSL and recompile"));
 #endif
 			break;
 		case '4':
-- 
cgit v0.10-9-g596f

