From 1c55e7287a4b1441958236956d20a2d908b3d8c3 Mon Sep 17 00:00:00 2001
From: Matthias Eble <psychotrahe@gmx.de>
Date: Mon, 1 Jun 2009 22:21:59 +0200
Subject: Fixed --help output for warn and critical thresholds (sf.net
 #2796624, debian #530553)

check_icmp wrongly calculated the current thresholds in --help output.

diff --git a/plugins-root/check_icmp.c b/plugins-root/check_icmp.c
index bbdfae7..4da6ea1 100644
--- a/plugins-root/check_icmp.c
+++ b/plugins-root/check_icmp.c
@@ -1284,10 +1284,10 @@ print_help(void)
   printf ("    %s\n", _("specify a target"));
   printf (" %s\n", "-w");
   printf ("    %s", _("warning threshold (currently "));
-  printf ("%0.3fms,%u%%)\n", (float)warn.rta / 1000 , warn.pl / 1000);
+  printf ("%0.3fms,%u%%)\n", (float)warn.rta / 1000, warn.pl);
   printf (" %s\n", "-c");
   printf ("    %s", _("critical threshold (currently "));
-  printf ("%0.3fms,%u%%)\n", (float)crit.rta, crit.pl);
+  printf ("%0.3fms,%u%%)\n", (float)crit.rta / 1000, crit.pl);
   printf (" %s\n", "-s");
   printf ("    %s\n", _("specify a source IP address or device name"));
   printf (" %s\n", "-n");
-- 
cgit v0.10-9-g596f

