From 1ca485eb821cd388270a996318e3ac9a8c9f9728 Mon Sep 17 00:00:00 2001
From: Ton Voon <tonvoon@users.sourceforge.net>
Date: Thu, 3 Jul 2003 15:00:16 +0000
Subject: Changing $() to `` to be compatible with Solaris' sh

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@584 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/tools/setup b/tools/setup
index 904120f..084399b 100755
--- a/tools/setup
+++ b/tools/setup
@@ -6,10 +6,10 @@
 # Requires: automake, autoconf, dpkg-dev
 # set -e
 
-MAKE=$(which gnumake)
-if test ! -x "$MAKE" ; then MAKE=$(which gmake) ; fi
-if test ! -x "$MAKE" ; then MAKE=$(which make) ; fi
-HAVE_GNU_MAKE=$($MAKE --version|grep -c "Free Software Foundation")
+MAKE=`which gnumake`
+if test ! -x "$MAKE" ; then MAKE=`which gmake` ; fi
+if test ! -x "$MAKE" ; then MAKE=`which make` ; fi
+HAVE_GNU_MAKE=`$MAKE --version|grep -c "Free Software Foundation"`
 
 if test "$HAVE_GNU_MAKE" != "1"; then 
 	echo Could not find GNU make on this system, can not proceed with build.
-- 
cgit v0.10-9-g596f

