From 27a624dd9f929af1330be508762057fa4fa8a0f5 Mon Sep 17 00:00:00 2001
From: Holger Weiss <hweiss@users.sourceforge.net>
Date: Mon, 23 Apr 2007 07:30:47 +0000
Subject: #ifdef can only test a single macro, not an expression.

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1699 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins/check_ping.c b/plugins/check_ping.c
index 211f74e..bf726d8 100644
--- a/plugins/check_ping.c
+++ b/plugins/check_ping.c
@@ -105,7 +105,7 @@ main (int argc, char **argv)
 
 	/* If ./configure finds ping has timeout values, set plugin alarm slightly
 	 * higher so that we can use response from command line ping */
-#ifdef PING_PACKETS_FIRST && PING_HAS_TIMEOUT
+#if defined(PING_PACKETS_FIRST) && defined(PING_HAS_TIMEOUT)
 	alarm (timeout_interval + 1);
 #else
 	alarm (timeout_interval);
-- 
cgit v0.10-9-g596f

