From 3120fe3806ac2df69be10097b71ec84974bbcea7 Mon Sep 17 00:00:00 2001
From: Ton Voon <tonvoon@users.sourceforge.net>
Date: Tue, 8 Jan 2008 11:57:24 +0000
Subject: Reverted commits 1898 and 1899 due to reversion of 1879

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1901 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins/t/check_ftp.t b/plugins/t/check_ftp.t
index 7d7cc68..47a73e1 100644
--- a/plugins/t/check_ftp.t
+++ b/plugins/t/check_ftp.t
@@ -27,7 +27,7 @@ my $t;
 
 $t += checkCmd( "./check_ftp $host_tcp_ftp       -wt 300 -ct 600",       0, $successOutput );
 $t += checkCmd( "./check_ftp $host_nonresponsive -wt 0   -ct 0   -to 1", 2 );
-$t += checkCmd( "./check_ftp $hostname_invalid   -wt 0   -ct 0",         3 );
+$t += checkCmd( "./check_ftp $hostname_invalid   -wt 0   -ct 0",         2 );
 
 exit(0) if defined($Test::Harness::VERSION);
 exit($tests - $t);
diff --git a/plugins/t/check_imap.t b/plugins/t/check_imap.t
index 2934302..fa957d1 100644
--- a/plugins/t/check_imap.t
+++ b/plugins/t/check_imap.t
@@ -36,7 +36,7 @@ $t = NPTest->testCmd( "./check_imap $host_nonresponsive" );
 cmp_ok( $t->return_code, '==', 2, "Get error with non reponsive host" );
 
 $t = NPTest->testCmd( "./check_imap $hostname_invalid" );
-cmp_ok( $t->return_code, '==', 3, "Invalid hostname" );
+cmp_ok( $t->return_code, '==', 2, "Invalid hostname" );
 
 $t = NPTest->testCmd( "./check_imap -H $host_tcp_imap -e unlikely_string");
 cmp_ok( $t->return_code, '==', 1, "Got warning with bad response" );
diff --git a/plugins/t/check_jabber.t b/plugins/t/check_jabber.t
index b619321..6a3d4ef 100644
--- a/plugins/t/check_jabber.t
+++ b/plugins/t/check_jabber.t
@@ -34,7 +34,7 @@ my $jabberOK = '/JABBER OK\s-\s\d+\.\d+\ssecond response time on port 5222/';
 
 my $jabberUnresponsive = '/CRITICAL\s-\sSocket timeout after\s\d+\sseconds/';
 
-my $jabberInvalid = '/JABBER UNKNOWN - Invalid hostname, address or socket:\s.+/';
+my $jabberInvalid = '/JABBER CRITICAL - Invalid hostname, address or socket:\s.+/';
 
 my $r;
 
@@ -60,6 +60,6 @@ is( $r->return_code, 2, "Unresponsive host gives critical" );
 like( $r->output, $jabberUnresponsive );
 
 $r = NPTest->testCmd( "./check_jabber $hostname_invalid" );
-is( $r->return_code, 3, "Invalid hostname gives critical" );
+is( $r->return_code, 2, "Invalid hostname gives critical" );
 like( $r->output, $jabberInvalid );
 
diff --git a/plugins/t/check_pop.t b/plugins/t/check_pop.t
index 565a577..b78291d 100644
--- a/plugins/t/check_pop.t
+++ b/plugins/t/check_pop.t
@@ -53,4 +53,4 @@ $res = NPTest->testCmd( "./check_pop $host_nonresponsive" );
 cmp_ok( $res->return_code, '==', 2, "Non responsive host");
 
 $res = NPTest->testCmd( "./check_pop $hostname_invalid" );
-cmp_ok( $res->return_code, '==', 3, "Invalid host");
+cmp_ok( $res->return_code, '==', 2, "Invalid host");
diff --git a/plugins/t/check_tcp.t b/plugins/t/check_tcp.t
index 83414d9..2914350 100644
--- a/plugins/t/check_tcp.t
+++ b/plugins/t/check_tcp.t
@@ -30,7 +30,7 @@ my $t;
 $t += checkCmd( "./check_tcp $host_tcp_http      -p 80 -wt 300 -ct 600",       0, $successOutput );
 $t += checkCmd( "./check_tcp $host_tcp_http      -p 81 -wt   0 -ct   0 -to 1", 2 ); # use invalid port for this test
 $t += checkCmd( "./check_tcp $host_nonresponsive -p 80 -wt   0 -ct   0 -to 1", 2 );
-$t += checkCmd( "./check_tcp $hostname_invalid   -p 80 -wt   0 -ct   0 -to 1", 3 );
+$t += checkCmd( "./check_tcp $hostname_invalid   -p 80 -wt   0 -ct   0 -to 1", 2 );
 
 # Need the \r\n to make it more standards compliant with web servers. Need the various quotes
 # so that perl doesn't interpret the \r\n and is passed onto command line correctly
-- 
cgit v0.10-9-g596f

