From 3179e551c29af098567d5109dca56d834506fdce Mon Sep 17 00:00:00 2001
From: Ton Voon <tonvoon@users.sourceforge.net>
Date: Sat, 17 May 2003 17:40:15 +0000
Subject: Fixed tests (Mathew Ericson - 738608)

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@518 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins/t/check_http.t b/plugins/t/check_http.t
index 2782fcd..0c71794 100644
--- a/plugins/t/check_http.t
+++ b/plugins/t/check_http.t
@@ -13,7 +13,7 @@ my $t;
 
 $str = `./check_http $Cache::hostname -wt 300 -ct 600`;
 $t += ok $?>>8,0;
-$t += ok $str, '/HTTP\/1.1 [0-9]{3} (OK|Found) - [0-9]+ second response time/';
+$t += ok $str, '/(HTTP\s[o|O][k|K]\s)?\s?HTTP\/1.[01]\s[0-9]{3}\s(OK|Found)\s-\s+([0-9]+|[0-9]+\.[0-9]+)\ssecond response time/';
 
 $str = `./check_http $Cache::nullhost -wt 1 -ct 2`;
 $t += ok $?>>8,2;
-- 
cgit v0.10-9-g596f

