From 34fdd021f91e2f715e2a321132e72fd8bfa472e5 Mon Sep 17 00:00:00 2001
From: Thomas Guyot-Sionnest <dermoth@users.sourceforge.net>
Date: Wed, 9 Jan 2008 04:27:52 +0000
Subject: make test-debug generate lots of false errors in tinderbox. Turning
 off until we find a solution (so al least we can watch the tinderbox for
 breakages again)

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1904 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/tools/tinderbox_build b/tools/tinderbox_build
index 93c4063..70fb07a 100755
--- a/tools/tinderbox_build
+++ b/tools/tinderbox_build
@@ -266,8 +266,8 @@ sub make {
 
 sub maketest {
         # Tests
-        print LOG "LANG=C make test-debug 2>&1\n";
-        open( MAKE, "LANG=C make test-debug && make install DESTDIR=$TmpDir/tinderbox_build.$$ && make install-strip DESTDIR=$TmpDir/tinderbox_build2.$$ 2>&1 |");
+        print LOG "LANG=C make test 2>&1\n";
+        open( MAKE, "LANG=C make test && make install DESTDIR=$TmpDir/tinderbox_build.$$ && make install-strip DESTDIR=$TmpDir/tinderbox_build2.$$ 2>&1 |");
 	while ( <MAKE> ) {
 		print $_;
 		print LOG $_;
-- 
cgit v0.10-9-g596f

