From 36abe4d0feccc7b5cd20629f95b54d8063a3477e Mon Sep 17 00:00:00 2001
From: "M. Sean Finney" <seanius@users.sourceforge.net>
Date: Thu, 22 Sep 2005 12:10:19 +0000
Subject: use test instead of '[ ... ]' in configure.in.  the check_procs/pst3
 situation is still not quite fixed.

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1239 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/configure.in b/configure.in
index 176a8e2..d621ad6 100644
--- a/configure.in
+++ b/configure.in
@@ -600,8 +600,8 @@ AC_PATH_PROG(PATH_TO_PS,ps)
 AC_MSG_CHECKING(for ps syntax)
 
 dnl Now using the pst3/kmem hack for solaris systems to avoid truncation
-if [ "$ac_cv_uname_s" = "SunOS" ]; then
-	ac_cv_ps_command="$prefix/pst3"
+if test "$ac_cv_uname_s" = "SunOS"; then
+	ac_cv_ps_command="pst3"
 	ac_cv_ps_format="%s %d %d %d %d %f %s %n"
 	ac_cv_ps_varlist="[procstat,&procuid,&procppid,&procvsz,&procrss,&procpcpu,procprog,&pos]"
 	ac_cv_ps_cols=8
-- 
cgit v0.10-9-g596f

