From 381715a2bd1f9163b791dc2a12ef8c60bac2c19a Mon Sep 17 00:00:00 2001
From: Thomas Guyot-Sionnest <dermoth@users.sourceforge.net>
Date: Sat, 27 Jan 2007 21:49:21 +0000
Subject: Fix #1643463: Miscalculating thresholds check_disk

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1589 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins/check_disk.c b/plugins/check_disk.c
index 99a7201..476c892 100644
--- a/plugins/check_disk.c
+++ b/plugins/check_disk.c
@@ -306,16 +306,16 @@ main (int argc, char **argv)
       critical_high_tide = UINT_MAX;
 
       if (path->freespace_units->warning != NULL) {
-        warning_high_tide = dtotal_units - path->freespace_units->warning->end;
+        warning_high_tide = path->freespace_units->warning->end;
       }
       if (path->freespace_percent->warning != NULL) {
-        warning_high_tide = abs( min( (double) warning_high_tide, (double) (1.0 - path->freespace_percent->warning->end/100)*dtotal_units ));
+        warning_high_tide = abs( min( (double) warning_high_tide, (double) path->freespace_percent->warning->end/100*dtotal_units ));
       }
       if (path->freespace_units->critical != NULL) {
-        critical_high_tide = dtotal_units - path->freespace_units->critical->end;
+        critical_high_tide = path->freespace_units->critical->end;
       }
       if (path->freespace_percent->critical != NULL) {
-        critical_high_tide = abs( min( (double) critical_high_tide, (double) (1.0 - path->freespace_percent->critical->end/100)*dtotal_units ));
+        critical_high_tide = abs( min( (double) critical_high_tide, (double) path->freespace_percent->critical->end/100*dtotal_units ));
       }
 
       asprintf (&perf, "%s %s", perf,
diff --git a/plugins/t/check_disk.t b/plugins/t/check_disk.t
index 50d2e6d..7235d70 100644
--- a/plugins/t/check_disk.t
+++ b/plugins/t/check_disk.t
@@ -24,7 +24,7 @@ my $mountpoint2_valid = getTestParameter( "NP_MOUNTPOINT2_VALID", "Path to anoth
 if ($mountpoint_valid eq "" or $mountpoint2_valid eq "") {
 	plan skip_all => "Need 2 mountpoints to test";
 } else {
-	plan tests => 57;
+	plan tests => 61;
 }
 
 $result = NPTest->testCmd( 
@@ -76,6 +76,24 @@ if ($free_inode_on_mp1 > $free_inode_on_mp2) {
 	die "Two mountpoints with same inodes free - cannot do rest of test";
 }
 
+# Verify performance data
+# First check absolute thresholds...
+$result = NPTest->testCmd(
+        "./check_disk -w 20 -c 10 -p $mountpoint_valid"
+        );
+$_ = $result->perf_output;
+my ($warn_absth_data, $crit_absth_data) = (m/=.[^;]*;(\d+);(\d+);\d+;\d+/);
+is ($warn_absth_data, 20, "Wrong warning in perf data using absolute thresholds");
+is ($crit_absth_data, 10, "Wrong critical in perf data using absolute thresholds");
+
+# Then check percent thresholds.
+$result = NPTest->testCmd(
+        "./check_disk -w 20% -c 10% -p $mountpoint_valid"
+        );
+$_ = $result->perf_output;
+my ($warn_percth_data, $crit_percth_data, $total_percth_data) = (m/=.[^;]*;(\d+);(\d+);\d+;(\d+)/);
+is ($warn_percth_data, int($total_percth_data/100*20), "Wrong warning in perf data using percent thresholds");
+is ($crit_percth_data, int($total_percth_data/100*10), "Wrong critical in perf data using percent thresholds");
 
 
 # Check when order of mount points are reversed, that perf data remains same
-- 
cgit v0.10-9-g596f

