From 3a359d9d90ff680c3bc9308752e14f71b02b31fd Mon Sep 17 00:00:00 2001
From: Karl DeBisschop <kdebisschop@users.sourceforge.net>
Date: Wed, 19 Nov 2003 06:00:53 +0000
Subject: use perfdata() to return perfoamnace data in stanadrd format

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@772 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins/check_smtp.c b/plugins/check_smtp.c
index 8440aab..8c4f26e 100644
--- a/plugins/check_smtp.c
+++ b/plugins/check_smtp.c
@@ -168,12 +168,13 @@ main (int argc, char **argv)
 	else if (check_warning_time && elapsed_time > (double) warning_time)
 		result = STATE_WARNING;
 
-	if (verbose)
-		printf (_("SMTP %s - %.3f sec. response time, %s|time=%ldus\n"),
-		        state_text (result), elapsed_time, buffer, microsec);
-	else
-		printf (_("SMTP %s - %.3f second response time|time=%ldus\n"),
-		        state_text (result), elapsed_time, microsec);
+	printf (_("SMTP %s - %.3f sec. response time%s%s|%s\n"),
+	        state_text (result), elapsed_time,
+          verbose?", ":"", verbose?buffer:"",
+	        perfdata ("time", microsec, "us",
+	                  check_warning_time, (long)(1000000*warning_time),
+	                  check_critical_time, (long)(1000000*critical_time),
+	                  TRUE, 0, FALSE, 0));
 
 	return result;
 }
-- 
cgit v0.10-9-g596f

