From 3b1194438640cff4dc2b1a0f03fcd03ae208d85b Mon Sep 17 00:00:00 2001
From: Ton Voon <tonvoon@users.sourceforge.net>
Date: Tue, 31 Jan 2006 16:47:28 +0000
Subject: Note on MacOSX difference in mysql package

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1312 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/REQUIREMENTS b/REQUIREMENTS
index bd08aa1..12552df 100644
--- a/REQUIREMENTS
+++ b/REQUIREMENTS
@@ -33,13 +33,18 @@ check_ldap:
 		Lib: libldap, liblber
 		Redhat Source: openldap-1.2.9-6.i386.rpm, openldap-devel-1.2.9-6.i386.rpm
 
-check_mysql:
+check_mysql, check_mysql_query:
 	- Requires the MySQL libraries available from
 	  http://www.mysql.org
 		Lib: libmysql, libmysqlclient
 		Redhat Powertools Source: mysql-3.20.32a-3.i386.rpm, mysql-devel-3.20.32a-3.i386.rpm (these seem to be broken, however)
 		RPMS from www.mysql.org work better
 
+	  If you use the Mac OS X package from mysql.org, you need to add two soft links for ./configure
+	  to find the mysql libraries correctly:
+		cd /usr/local/mysql/lib && ln -s . mysql
+		cd /usr/local/mysql/include && ln -s . mysql
+
 check_pqsql:
 	- Requires the PostgreSQL libraries available from
 	  http://www.postgresql.org
-- 
cgit v0.10-9-g596f

