From 489f4501f8d6bc1f53b4c808ecade65e7b0175cd Mon Sep 17 00:00:00 2001
From: Karl DeBisschop <kdebisschop@users.sourceforge.net>
Date: Tue, 28 Jan 2003 07:44:56 +0000
Subject: typo: had commented use Net::SNMP for testing

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@260 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/contrib/checkciscotemp.pl b/contrib/checkciscotemp.pl
index c999e19..8fdc429 100644
--- a/contrib/checkciscotemp.pl
+++ b/contrib/checkciscotemp.pl
@@ -30,7 +30,7 @@
 # (in accordance with the plugin coding guidelines)
 ####################################
 
-#use Net::SNMP;
+use Net::SNMP;
 use Getopt::Long;
 &Getopt::Long::config('auto_abbrev');
 
-- 
cgit v0.10-9-g596f

