From 4d5eb82a47261dae0e866d82bca6648a2048e01b Mon Sep 17 00:00:00 2001
From: Thomas Guyot-Sionnest <dermoth@aei.ca>
Date: Fri, 9 Jan 2009 02:31:42 -0500
Subject: basename check in test_utils.c was accidentaly added again.

In 538b97c I reverted a serie of libtap patch by Ton Voon; it included
the removal of the useless basename check.

Relevant portion of the changelog from which it was removed (f31cd40):

  Removed basename test as we should use base_name from GNUlib which is
	tested separately

diff --git a/lib/tests/test_utils.c b/lib/tests/test_utils.c
index e946290..5ad3f8a 100644
--- a/lib/tests/test_utils.c
+++ b/lib/tests/test_utils.c
@@ -171,10 +171,6 @@ main (int argc, char **argv)
 
 	test = np_escaped_string("everything");
 	ok( strcmp(test, "everything") == 0, "everything okay");
-	free(test);
-
-	test = (char *)basename("/here/is/a/path");
-	ok( strcmp(test, "path") == 0, "basename okay");
 
 	return exit_status();
 }
-- 
cgit v0.10-9-g596f

