From 4e157fb8cd6aa5dc93f316bb6d474c8a51f37bfe Mon Sep 17 00:00:00 2001
From: Ton Voon <tonvoon@users.sourceforge.net>
Date: Tue, 21 Mar 2006 13:42:18 +0000
Subject: Updated to new Test::More method for testing

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1337 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins/t/check_load.t b/plugins/t/check_load.t
index 8f954dc..749dcc1 100644
--- a/plugins/t/check_load.t
+++ b/plugins/t/check_load.t
@@ -6,20 +6,21 @@
 #
 
 use strict;
-use Test;
+use Test::More;
 use NPTest;
 
-use vars qw($tests);
-BEGIN {$tests = 4; plan tests => $tests}
+my $res;
 
 my $successOutput = '/^OK - load average: [0-9]\.?[0-9]+, [0-9]\.?[0-9]+, [0-9]\.?[0-9]+/';
 my $failureOutput = '/^CRITICAL - load average: [0-9]\.?[0-9]+, [0-9]\.?[0-9]+, [0-9]\.?[0-9]+/';
 
-my $t;
+plan tests => 4;
 
-$t += checkCmd( "./check_load -w 100,100,100 -c 100,100,100", 0, $successOutput );
-$t += checkCmd( "./check_load -w 0,0,0       -c 0,0,0",       2, $failureOutput );
+$res = NPTest->testCmd( "./check_load -w 100,100,100 -c 100,100,100" );
+cmp_ok( $res->return_code, 'eq', 0, "load not over 100");
+like( $res->output, $successOutput, "Output OK");
 
-exit(0) if defined($Test::Harness::VERSION);
-exit($tests - $t);
+$res = NPTest->testCmd( "./check_load -w 0,0,0 -c 0,0,0" );
+cmp_ok( $res->return_code, 'eq', 2, "Load over 0");
+like( $res->output, $failureOutput, "Output OK");
 
-- 
cgit v0.10-9-g596f

