From 5dd7b5dff439ab19119efd24d7822ca19b3e5bf7 Mon Sep 17 00:00:00 2001
From: "M. Sean Finney" <seanius@users.sourceforge.net>
Date: Wed, 19 Oct 2005 13:05:41 +0000
Subject: endif was a few lines off of where it should be

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1256 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins/check_http.c b/plugins/check_http.c
index d47f5ce..294866b 100644
--- a/plugins/check_http.c
+++ b/plugins/check_http.c
@@ -801,16 +801,15 @@ check_http (void)
 		if (connect_SSL () != OK) {
 			die (STATE_CRITICAL, _("Unable to open TCP socket\n"));
 		}
-#ifdef USE_OPENSSL
+#  ifdef USE_OPENSSL
 		if ((server_cert = SSL_get_peer_certificate (ssl)) != NULL) {
 			X509_free (server_cert);
 		}
-#endif
 		else {
 			printf (_("CRITICAL - Cannot retrieve server certificate.\n"));
 			return STATE_CRITICAL;
 		}
-
+#  endif /* USE_OPENSSL */
 	}
 	else {
 #endif
-- 
cgit v0.10-9-g596f

