From 5fcffd79783da265ff9b44f71e0d77c721578890 Mon Sep 17 00:00:00 2001
From: Thomas Guyot-Sionnest <dermoth@users.sourceforge.net>
Date: Tue, 29 Jan 2008 08:55:50 +0000
Subject: typo

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1910 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/NEWS b/NEWS
index 628210d..76cd803 100644
--- a/NEWS
+++ b/NEWS
@@ -7,7 +7,7 @@ This file documents the major additions and syntax changes between releases.
 	Fix segfault in check_ntp_time and (deprecated) check_ntp (Bug #1862300)
 	check_disk should now work with large file systems (2TB+) on all archs that supports it
 	Fixed check_disk disk usage calculation when using --group=NAME (related to bug #1348746)
-	Fix help text of check_ntp_* (Bug #1880095)
+	Fix help text of check_ntp* (Bug #1880095)
 	Fix bugs and flaws in best offset server selection of check_ntp_time and (deprecated) check_ntp
 
 1.4.11 13th December 2007
-- 
cgit v0.10-9-g596f

