From 6240b64efd8a4148e90b029cf86b20a69439ce34 Mon Sep 17 00:00:00 2001
From: Ton Voon <tonvoon@users.sourceforge.net>
Date: Mon, 20 Dec 2004 21:26:41 +0000
Subject: Fix compile errors when looking for openssl

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1040 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/configure.in b/configure.in
index 21d28de..8c19635 100644
--- a/configure.in
+++ b/configure.in
@@ -293,12 +293,12 @@ else
   dnl Check usual areas for openssl
   if test "$PKGTEST" = "yes"; then
     AC_PATH_PROG(OPENSSL,openssl)
-    # Don't think 2 tests below are necessary because /usr is always included
-    # if test "$OPENSSL" = "/usr/bin/openssl"; then
-    #  OPENSSL=/usr
-    #elif test "$OPENSSL" = "/usr/sbin/openssl"; then
-    #  OPENSSL=/usr
-    if test "$OPENSSL" = "/opt/bin/openssl"; then
+    dnl The /usr checks need to be done so that the right area is include'd
+    if test "$OPENSSL" = "/usr/bin/openssl"; then
+      OPENSSL=/usr
+    elif test "$OPENSSL" = "/usr/sbin/openssl"; then
+      OPENSSL=/usr
+    elif test "$OPENSSL" = "/opt/bin/openssl"; then
       OPENSSL=/opt
     elif test "$OPENSSL" = "/opt/openssl/bin/openssl"; then
       OPENSSL=/opt/openssl
@@ -386,7 +386,11 @@ else
   fi
 
   if test "$OPENSSL_ENABLED" != "1"; then
-    AC_MSG_WARN([OpenSSL libs and/or directories were not found where specified!])
+    if test "$PKGTEST" ="yes"; then
+      AC_MSG_WARN([OpenSSL libs could not be found])
+    else
+      AC_MSG_WARN([OpenSSL libs and/or directories were not found where specified!])
+    fi
     with_openssl="no"
   else
     check_tcp_ssl="check_simap check_spop check_jabber check_nntps"
-- 
cgit v0.10-9-g596f

