From 6624dda25517f70f692f2dc02d7d1d9c0abc19e3 Mon Sep 17 00:00:00 2001
From: Ton Voon <tonvoon@users.sourceforge.net>
Date: Mon, 20 Dec 2004 21:38:44 +0000
Subject: - stupid typo

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1041 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/configure.in b/configure.in
index 8c19635..f5d772d 100644
--- a/configure.in
+++ b/configure.in
@@ -386,7 +386,7 @@ else
   fi
 
   if test "$OPENSSL_ENABLED" != "1"; then
-    if test "$PKGTEST" ="yes"; then
+    if test "$PKGTEST" = "yes"; then
       AC_MSG_WARN([OpenSSL libs could not be found])
     else
       AC_MSG_WARN([OpenSSL libs and/or directories were not found where specified!])
-- 
cgit v0.10-9-g596f

