From 665283575568e3184ba2881cf4a8474e6e11ffa5 Mon Sep 17 00:00:00 2001
From: Subhendu Ghosh <sghosh@users.sourceforge.net>
Date: Wed, 4 Sep 2002 02:10:37 +0000
Subject: moved to supported plugins-scripts

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@88 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/contrib/check_ifoperstatus.pl b/contrib/check_ifoperstatus.pl
deleted file mode 100644
index 3f21cdd..0000000
--- a/contrib/check_ifoperstatus.pl
+++ /dev/null
@@ -1,145 +0,0 @@
-#!/usr/bin/perl -w
-#
-# check_ifoperstatus.pl - nagios plugin 
-# 
-#
-#
-#
-# Copyright (C) 2000 Christoph Kron
-#
-# This program is free software; you can redistribute it and/or
-# modify it under the terms of the GNU General Public License
-# as published by the Free Software Foundation; either version 2
-# of the License, or (at your option) any later version.
-#
-# This program is distributed in the hope that it will be useful,
-# but WITHOUT ANY WARRANTY; without even the implied warranty of
-# MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
-# GNU General Public License for more details.
-#
-# You should have received a copy of the GNU General Public License
-# along with this program; if not, write to the Free Software
-# Foundation, Inc., 59 Temple Place - Suite 330, Boston, MA  02111-1307, USA.
-#
-#
-# Report bugs to: ck@zet.net
-#
-# 11.01.2000 Version 1.0
-
-use strict;
-
-use Net::SNMP;
-use Getopt::Long;
-&Getopt::Long::config('auto_abbrev');
-
-
-my $status;
-my $TIMEOUT = 15;
-
-my %ERRORS = ('UNKNOWN' , '-1',
-              'OK' , '0',
-              'WARNING', '1',
-              'CRITICAL', '2');
-
-my %ifOperStatus = 	('1','up',
-			 '2','down',
-			 '3','testing',
-			 '4','unknown',
-			 '5','dormant',
-			 '6','notPresent');
-
-my $state = "UNKNOWN";
-my $answer = "";
-my $snmpkey = 1;
-my $community = "public";
-my $port = 161;
-my @snmpoids;
-my $snmpIfOperStatus;
-my $snmpLocIfDescr;
-my $hostname;
-my $session;
-my $error;
-my $response;
-
-
-sub usage {
-  printf "\nMissing arguments!\n";
-  printf "\n";
-  printf "Perl Check IfOperStatus plugin for Nagios\n";
-  printf  "checks operational status of specified interface\n";
-  printf "usage: \n";
-  printf "ifoperstatus.pl -k <IF_KEY> -c <READCOMMUNITY> -p <PORT> <HOSTNAME>";
-  printf "\nCopyright (C) 2000 Christoph Kron\n";
-  printf "check_ifoperstatus.pl comes with ABSOLUTELY NO WARRANTY\n";
-  printf "This programm is licensed under the terms of the ";
-  printf "GNU General Public License\n(check source code for details)\n";
-  printf "\n\n";
-  exit $ERRORS{"UNKNOWN"};
-}
-
-# Just in case of problems, let's not hang Nagios
-$SIG{'ALRM'} = sub {
-     print ("ERROR: No snmp response from $hostname (alarm)\n");
-     exit $ERRORS{"UNKNOWN"};
-};
-alarm($TIMEOUT);
-
-
-$status = GetOptions("key=i",\$snmpkey,
-                     "community=s",\$community,
-                     "port=i",\$port);
-if ($status == 0)
-{
-        &usage;
-}
-  
-   #shift;
-   $hostname  = shift || &usage;
-
-   ($session, $error) = Net::SNMP->session(
-      -hostname  => $hostname,
-      -community => $community,
-      -port      => $port
-   );
-
-   if (!defined($session)) {
-      $state='UNKNOWN';
-      $answer=$error;
-      print ("$state: $answer");
-      exit $ERRORS{$state};
-   }
-
-   $snmpIfOperStatus = '1.3.6.1.2.1.2.2.1.8' . "." . $snmpkey;
-   $snmpLocIfDescr = '1.3.6.1.4.1.9.2.2.1.1.28' . "." . $snmpkey;
-
-
-   push(@snmpoids,$snmpIfOperStatus);
-   push(@snmpoids,$snmpLocIfDescr);
-
-   if (!defined($response = $session->get_request(@snmpoids))) {
-      $answer=$session->error;
-      $session->close;
-      $state = 'CRITICAL';
-      print ("$state: $answer,$community,$snmpkey");
-      exit $ERRORS{$state};
-   }
-
-   $answer = sprintf("host '%s',%s(%s) is %s\n", 
-      $hostname, 
-      $response->{$snmpLocIfDescr},
-      $snmpkey, 
-      $ifOperStatus{$response->{$snmpIfOperStatus}}
-   );
-
-   $session->close;
-
-   if ( $response->{$snmpIfOperStatus} == 1 ) {
-      $state = 'OK';
-   }
-   else {
-	$state = 'CRITICAL';
-   }
-
-print ("$state: $answer");
-exit $ERRORS{$state};
-
diff --git a/contrib/check_ifstatus.pl b/contrib/check_ifstatus.pl
deleted file mode 100644
index a7ab39e..0000000
--- a/contrib/check_ifstatus.pl
+++ /dev/null
@@ -1,178 +0,0 @@
-#!/usr/bin/perl -w
-#
-# check_ifstatus.pl - nagios plugin 
-# 
-#
-# Copyright (C) 2000 Christoph Kron
-#
-# This program is free software; you can redistribute it and/or
-# modify it under the terms of the GNU General Public License
-# as published by the Free Software Foundation; either version 2
-# of the License, or (at your option) any later version.
-#
-# This program is distributed in the hope that it will be useful,
-# but WITHOUT ANY WARRANTY; without even the implied warranty of
-# MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
-# GNU General Public License for more details.
-#
-# You should have received a copy of the GNU General Public License
-# along with this program; if not, write to the Free Software
-# Foundation, Inc., 59 Temple Place - Suite 330, Boston, MA  02111-1307, USA.
-#
-#
-# Report bugs to: ck@zet.net
-#
-# 11.01.2000 Version 1.0
-
-use strict;
-
-use Net::SNMP;
-use Getopt::Long;
-&Getopt::Long::config('auto_abbrev');
-
-
-my $status;
-my $TIMEOUT = 1500;
-
-my %ERRORS = ('UNKNOWN' , '-1',
-              'OK' , '0',
-              'WARNING', '1',
-              'CRITICAL', '2');
-
-my %ifOperStatus = 	('1','up',
-			 '2','down',
-			 '3','testing',
-			 '4','unknown',
-			 '5','dormant',
-			 '6','notPresent');
-
-my $state = "UNKNOWN";
-my $answer = "";
-my $snmpkey;
-my $snmpoid;
-my $key;
-my $community = "public";
-my $port = 161;
-my @snmpoids;
-my $snmpIfAdminStatus = '1.3.6.1.2.1.2.2.1.7';
-my $snmpIfDescr = '1.3.6.1.2.1.2.2.1.2';
-my $snmpIfOperStatus = '1.3.6.1.2.1.2.2.1.8';
-my $snmpLocIfDescr = '1.3.6.1.4.1.9.2.2.1.1.28';
-my $hostname;
-my $session;
-my $error;
-my $response;
-my %ifStatus;
-my $ifup =0 ;
-my $ifdown =0;
-my $ifdormant = 0;
-my $ifmessage;
-
-sub usage {
-  printf "\nMissing arguments!\n";
-  printf "\n";
-  printf "Perl Check IfStatus plugin for Nagios\n";
-  printf "monitors operational status of each interface\n";
-  printf "usage: \n";
-  printf "check_ifstatus.pl -c <READCOMMUNITY> -p <PORT> <HOSTNAME>\n";
-  printf "Copyright (C) 2000 Christoph Kron\n";
-  printf "check_ifstatus.pl comes with ABSOLUTELY NO WARRANTY\n";
-  printf "This programm is licensed under the terms of the ";
-  printf "GNU General Public License\n(check source code for details)\n";
-  printf "\n\n";
-  exit $ERRORS{"UNKNOWN"};
-}
-
-# Just in case of problems, let's not hang Nagios
-$SIG{'ALRM'} = sub {
-     print ("ERROR: No snmp response from $hostname (alarm)\n");
-     exit $ERRORS{"UNKNOWN"};
-};
-alarm($TIMEOUT);
-
-
-$status = GetOptions("community=s",\$community,
-                     "port=i",\$port);
-if ($status == 0)
-{
-        &usage;
-}
-  
-   #shift;
-   $hostname  = shift || &usage;
-
-
-
-   push(@snmpoids,$snmpIfOperStatus);
-   push(@snmpoids,$snmpLocIfDescr);
-   push(@snmpoids,$snmpIfAdminStatus);
-   push(@snmpoids,$snmpIfDescr);
-
-foreach $snmpoid (@snmpoids) {
-
-   ($session, $error) = Net::SNMP->session(
-      -hostname  => $hostname,
-      -community => $community,
-      -port      => $port
-   );
-
-   if (!defined($session)) {
-      $state='UNKNOWN';
-      $answer=$error;
-      print ("$state: $answer");
-      exit $ERRORS{$state};
-   }
-
-   if (!defined($response = $session->get_table($snmpoid))) {
-      $answer=$session->error;
-      $session->close;
-      $state = 'CRITICAL';
-      print ("$state: $answer,$community,$snmpkey");
-      exit $ERRORS{$state};
-   }
-
-   foreach $snmpkey (keys %{$response}) {
-      $snmpkey =~ /.*\.(\d+)$/;
-      $key = $1;
-      $ifStatus{$key}{$snmpoid} = $response->{$snmpkey};
-   }
-   $session->close;
-}
-
-   foreach $key (keys %ifStatus) {
-      # check only if interface is administratively up
-      if ($ifStatus{$key}{$snmpIfAdminStatus} == 1 ) {
-         if ($ifStatus{$key}{$snmpIfOperStatus} == 1 ) { $ifup++ ;}
-         if ($ifStatus{$key}{$snmpIfOperStatus} == 2 ) {
-             $ifdown++ ;
-             $ifmessage .= sprintf("%s: down -> %s<BR>",
-                                 $ifStatus{$key}{$snmpIfDescr},
-				 $ifStatus{$key}{$snmpLocIfDescr});
-
-         }
-         if ($ifStatus{$key}{$snmpIfOperStatus} == 5 ) { $ifdormant++ ;}
-      }
-   }
-   
-
-   if ($ifdown > 0) {
-      $state = 'CRITICAL';
-      $answer = sprintf("host '%s', interfaces up: %d, down: %d, dormant: %d<BR>",
-                        $hostname,
-			$ifup,
-			$ifdown,
-			$ifdormant);
-      $answer = $answer . $ifmessage . "\n";
-   }
-   else {
-      $state = 'OK';
-      $answer = sprintf("host '%s', interfaces up: %d, down: %d, dormant: %d\n",
-                        $hostname,
-			$ifup,
-			$ifdown,
-			$ifdormant);
-   }
-
-print ("$state: $answer");
-exit $ERRORS{$state};
-
-- 
cgit v0.10-9-g596f

