From 66ada169aadff3d614ed109bf12df2f94a381c37 Mon Sep 17 00:00:00 2001
From: Ton Voon <tonvoon@users.sourceforge.net>
Date: Wed, 14 Sep 2005 09:49:17 +0000
Subject: - Removing typos

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1217 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/configure.in b/configure.in
index 4f9dc1c..2f1274b 100644
--- a/configure.in
+++ b/configure.in
@@ -708,7 +708,6 @@ then
 	ac_cv_ps_cols=9
 	AC_MSG_RESULT([$ac_cv_ps_command])
 
-XXX
 elif ps -eo 's comm vsz rss user uid pid ppid args' 2>/dev/null | \
 	egrep -i ["^S[TAUES]* +C[OMDNA]+ +[VSIZE]+ +U[SER]+ +U[ID]+ +P[PID]+ +P[PID]+ +[RGSCOMDNA]+"] >/dev/null
 then
@@ -833,7 +832,6 @@ then
 	ac_cv_ps_format="%*s %s %d %d %d %*s %*s %*s %*s %*s %*s %*s %*s %*s %n%s"
 	ac_cv_ps_cols=8
 	AC_MSG_RESULT([$ac_cv_ps_command])
-XXX
 
 else
 	AC_MSG_WARN([unable to find usable ps syntax - check_procs and check_nagios will not be compiled])
-- 
cgit v0.10-9-g596f

