From 68fbbb6d638c827afbc567b03e5488a476a9b1b6 Mon Sep 17 00:00:00 2001
From: Ton Voon <tonvoon@users.sourceforge.net>
Date: Wed, 20 Dec 2006 22:33:29 +0000
Subject: Removed unused timestamp variable (Matthias Eble) Fixed redirection
 test. Added extra tests for funny syntax when checking certificates, updated
 help for more common syntax

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1555 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/CHANGES b/CHANGES
index ea461db..3f5c0a6 100644
--- a/CHANGES
+++ b/CHANGES
@@ -5,6 +5,7 @@ This file documents the major additions and syntax changes between releases.
 	Fixed compile problems with *BSD re: alloca.h
 	Fixed Solaris problems with check_swap (tested on Solaris 9)
 	Fixed check_swap for HP/UX where swapinfo command was incorrect
+	Fixed check_disk inode threshold checks, regressed at r1.4.4.
 
 1.4.5
 	Fixed bug in perl's is_hostname routine
diff --git a/THANKS.in b/THANKS.in
index ae5ba1f..031cc4a 100644
--- a/THANKS.in
+++ b/THANKS.in
@@ -203,3 +203,4 @@ Florian Gleixner
 Pawel Malachowski
 Duncan Ferguson
 Dick van den Burg
+Matthias Eble
diff --git a/plugins/check_http.c b/plugins/check_http.c
index 05ae55b..203ebe5 100644
--- a/plugins/check_http.c
+++ b/plugins/check_http.c
@@ -88,7 +88,6 @@ struct timeval tv;
 #define HTTP_URL "/"
 #define CRLF "\r\n"
 
-char timestamp[17] = "";
 int specify_port = FALSE;
 int server_port = HTTP_PORT;
 char server_port_text[6] = "";
@@ -147,13 +146,6 @@ main (int argc, char **argv)
   if (process_arguments (argc, argv) == ERROR)
     usage4 (_("Could not parse arguments"));
 
-  if (strstr (timestamp, ":")) {
-    if (strstr (server_url, "?"))
-      asprintf (&server_url, "%s&%s", server_url, timestamp);
-    else
-      asprintf (&server_url, "%s?%s", server_url, timestamp);
-  }
-
   if (display_html == TRUE)
     printf ("<A HREF=\"%s://%s:%d%s\" target=\"_blank\">", 
       use_ssl ? "https" : "http", host_name,
@@ -861,7 +853,7 @@ check_http (void)
 
   /* return a CRITICAL status if we couldn't read any data */
   if (pagesize == (size_t) 0)
-    die (STATE_CRITICAL, _("No data received %s\n"), timestamp);
+    die (STATE_CRITICAL, _("No data received from host\n"));
 
   /* close the connection */
 #ifdef HAVE_SSL
@@ -967,8 +959,8 @@ check_http (void)
       microsec = deltime (tv);
       elapsed_time = (double)microsec / 1.0e6;
       die (onredirect,
-           _(" - %s - %.3f second response time %s%s|%s %s\n"),
-           status_line, elapsed_time, timestamp,
+           _(" - %s - %.3f second response time %s|%s %s\n"),
+           status_line, elapsed_time, 
            (display_html ? "</A>" : ""),
            perfd_time (elapsed_time), perfd_size (pagesize));
     } /* end if (http_status >= 300) */
@@ -983,8 +975,8 @@ check_http (void)
   microsec = deltime (tv);
   elapsed_time = (double)microsec / 1.0e6;
   asprintf (&msg,
-            _("HTTP WARNING: %s - %.3f second response time %s%s|%s %s\n"),
-            status_line, elapsed_time, timestamp,
+            _("HTTP WARNING: %s - %.3f second response time %s|%s %s\n"),
+            status_line, elapsed_time, 
             (display_html ? "</A>" : ""),
             perfd_time (elapsed_time), perfd_size (pagesize));
   if (check_critical_time == TRUE && elapsed_time > critical_time)
@@ -997,9 +989,9 @@ check_http (void)
 
   if (strlen (string_expect)) {
     if (strstr (page, string_expect)) {
-      printf (_("HTTP OK %s - %.3f second response time %s%s|%s %s\n"),
+      printf (_("HTTP OK %s - %.3f second response time %s|%s %s\n"),
               status_line, elapsed_time,
-              timestamp, (display_html ? "</A>" : ""),
+              (display_html ? "</A>" : ""),
               perfd_time (elapsed_time), perfd_size (pagesize));
       exit (STATE_OK);
     }
@@ -1014,9 +1006,9 @@ check_http (void)
   if (strlen (regexp)) {
     errcode = regexec (&preg, page, REGS, pmatch, 0);
     if ((errcode == 0 && invert_regex == 0) || (errcode == REG_NOMATCH && invert_regex == 1)) {
-      printf (_("HTTP OK %s - %.3f second response time %s%s|%s %s\n"),
+      printf (_("HTTP OK %s - %.3f second response time %s|%s %s\n"),
               status_line, elapsed_time,
-              timestamp, (display_html ? "</A>" : ""),
+              (display_html ? "</A>" : ""),
               perfd_time (elapsed_time), perfd_size (pagesize));
       exit (STATE_OK);
     }
@@ -1052,9 +1044,9 @@ check_http (void)
     exit (STATE_WARNING);
   }
   /* We only get here if all tests have been passed */
-  asprintf (&msg, _("HTTP OK %s - %d bytes in %.3f seconds %s%s|%s %s\n"),
+  asprintf (&msg, _("HTTP OK %s - %d bytes in %.3f seconds %s|%s %s\n"),
             status_line, page_len, elapsed_time,
-            timestamp, (display_html ? "</A>" : ""),
+            (display_html ? "</A>" : ""),
             perfd_time (elapsed_time), perfd_size (page_len));
   die (STATE_OK, "%s", msg);
   return STATE_UNKNOWN;
@@ -1263,9 +1255,9 @@ print_help (void)
 
 #ifdef HAVE_SSL
   printf (" %s\n", "-S, --ssl");
-  printf ("   %s\n", _("Connect via SSL"));
+  printf ("   %s\n", _("Connect via SSL. Port defaults to 443"));
   printf (" %s\n", "-C, --certificate=INTEGER");
-  printf ("   %s\n", _("Minimum number of days a certificate has to be valid."));
+  printf ("   %s\n", _("Minimum number of days a certificate has to be valid. Port defaults to 443"));
   printf ("   %s\n", _("(when this option is used the url is not checked.)\n"));
 #endif
 
@@ -1329,13 +1321,13 @@ print_help (void)
   printf (" %s\n", _("serve content (optionally within a specified time) or whether the X509 "));
   printf (" %s\n", _("certificate is still valid for the specified number of days."));
   printf (_("Examples:"));
-  printf (" %s\n\n", "CHECK CONTENT: check_http -w 5 -c 10 --ssl www.verisign.com");
+  printf (" %s\n\n", "CHECK CONTENT: check_http -w 5 -c 10 --ssl -H www.verisign.com");
   printf (" %s\n", _("When the 'www.verisign.com' server returns its content within 5 seconds,"));
   printf (" %s\n", _("a STATE_OK will be returned. When the server returns its content but exceeds"));
   printf (" %s\n", _("the 5-second threshold, a STATE_WARNING will be returned. When an error occurs,"));
   printf (" %s\n\n", _("a STATE_CRITICAL will be returned."));
 
-  printf (" %s\n\n", "CHECK CERTIFICATE: check_http www.verisign.com -C 14");
+  printf (" %s\n\n", "CHECK CERTIFICATE: check_http -H www.verisign.com -C 14");
   printf (" %s\n", _("When the certificate of 'www.verisign.com' is valid for more than 14 days,"));
   printf (" %s\n", _("a STATE_OK is returned. When the certificate is still valid, but for less than"));
   printf (" %s\n", _("14 days, a STATE_WARNING is returned. A STATE_CRITICAL will be returned when"));
diff --git a/plugins/t/check_http.t b/plugins/t/check_http.t
index 21ac0f7..5b67886 100644
--- a/plugins/t/check_http.t
+++ b/plugins/t/check_http.t
@@ -9,7 +9,7 @@ use strict;
 use Test::More;
 use NPTest;
 
-plan tests => 22;
+plan tests => 26;
 
 my $successOutput = '/OK.*HTTP.*second/';
 
@@ -68,6 +68,14 @@ cmp_ok( $res->return_code, '==', 0, "Checking certificate for www.verisign.com")
 like  ( $res->output, '/Certificate will expire on/', "Output OK" );
 my $saved_cert_output = $res->output;
 
+$res = NPTest->testCmd( "./check_http www.verisign.com -C 1" );
+is( $res->return_code, 0, "Old syntax for cert checking okay" );
+is( $res->output, $saved_cert_output, "Same output as new syntax" );
+
+$res = NPTest->testCmd( "./check_http -H www.verisign.com -C 1" );
+is( $res->return_code, 0, "Updated syntax for cert checking okay" );
+is( $res->output, $saved_cert_output, "Same output as new syntax" );
+
 $res = NPTest->testCmd( "./check_http -C 1 www.verisign.com" );
 cmp_ok( $res->output, 'eq', $saved_cert_output, "--ssl option automatically added");
 
@@ -96,6 +104,6 @@ like ( $res->output, "/pattern found/", "Error message says 'pattern found'");
 $res = NPTest->testCmd( "./check_http -H altinity.com -r 'nAGiOs' --invert-regex" );
 cmp_ok( $res->return_code, "==", 0, "And also when not found");
 
-$res = NPTest->testCmd( "./check_http -H www.worldfirefoxday.com -f follow" );
+$res = NPTest->testCmd( "./check_http -H www.mozilla.com -u /firefox -f follow" );
 is( $res->return_code, 0, "Redirection based on location is okay");
 
-- 
cgit v0.10-9-g596f

