From 6941b9f66b396342f4c5926a6c6b25911c382ffd Mon Sep 17 00:00:00 2001
From: Ton Voon <tonvoon@users.sourceforge.net>
Date: Wed, 29 Mar 2006 08:18:50 +0000
Subject: Fix possible timeout issue on hostname_invalid

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1362 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins/t/check_http.t b/plugins/t/check_http.t
index 24e4fd6..408906d 100644
--- a/plugins/t/check_http.t
+++ b/plugins/t/check_http.t
@@ -45,7 +45,8 @@ $res = NPTest->testCmd(
 cmp_ok( $res->return_code, '==', 2, "Webserver $hostname_invalid not valid" );
 # The first part of the message comes from the OS catalogue, so cannot check this.
 # On Debian, it is Name or service not known, on Darwin, it is No address associated with nodename
-like( $res->output, "/Unable to open TCP socket/", "Output OK");
+# Is also possible to get a socket timeout if DNS is not responding fast enough
+like( $res->output, "/Unable to open TCP socket|Socket timeout after/", "Output OK");
 
 $res = NPTest->testCmd(
 	"./check_http --ssl www.verisign.com"
-- 
cgit v0.10-9-g596f

