From 70cdf8f9d858526dd5b4ea9cad3a8d6f0a62f038 Mon Sep 17 00:00:00 2001
From: Subhendu Ghosh <sghosh@users.sourceforge.net>
Date: Tue, 25 Jun 2002 13:55:07 +0000
Subject: check motherboard/cpu temp via lmmon

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@59 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/contrib/check_lmmon.pl b/contrib/check_lmmon.pl
new file mode 100644
index 0000000..bf4b438
--- /dev/null
+++ b/contrib/check_lmmon.pl
@@ -0,0 +1,19 @@
+#!/usr/bin/perl
+# NetSaint Temp warning script
+# Written by: Nathan LeSueur
+
+if ($#ARGV < 1) {
+print "Usage: $0 <critical temp> <warning temp> <normal temp>\n";
+exit; } $crit = shift; $warn = shift; $norm = shift; if ($warn >
+$crit) {    print "Warning level cannot be greater than critical
+level!\n"; exit; } @b = qx{/usr/local/bin/lmmon -s}; foreach(@b) { @c
+= split(/ \/ /, $_); $d = $c[1]; } @e = split(/F/, $d); $f = $e[0];
+
+$status = "$f degrees F\n";
+
+if($f >= $crit) {print "CRITICAL - $status"; exit 2;}
+if($f >= $warn) {print "WARNING - $status"; exit 1;}
+if($f <= $norm && $f != 0) {print "OK - $status"; exit 0;}
+else{print "UNKNOWN - unable to access smb\n"; exit (-1);}
+
+
-- 
cgit v0.10-9-g596f

