From 82ff622fd0e9fa654a0c54667b19bf92676479d0 Mon Sep 17 00:00:00 2001
From: Karl DeBisschop <kdebisschop@users.sourceforge.net>
Date: Tue, 2 Mar 2004 05:25:33 +0000
Subject: relax check for -w/-c to accept floats (bug report from Warrick
 FitzGerald)

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@835 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins/check_http.c b/plugins/check_http.c
index e6f88e9..b676eec 100644
--- a/plugins/check_http.c
+++ b/plugins/check_http.c
@@ -255,7 +255,7 @@ process_arguments (int argc, char **argv)
 				socket_timeout = atoi (optarg);
 			break;
 		case 'c': /* critical time threshold */
-			if (!is_intnonneg (optarg))
+			if (!is_nonnegative (optarg))
 				usage2 (_("invalid critical threshold"), optarg);
 			else {
 				critical_time = strtod (optarg, NULL);
@@ -263,7 +263,7 @@ process_arguments (int argc, char **argv)
 			}
 			break;
 		case 'w': /* warning time threshold */
-			if (!is_intnonneg (optarg))
+			if (!is_nonnegative (optarg))
 				usage2 (_("invalid warning threshold"), optarg);
 			else {
 				warning_time = strtod (optarg, NULL);
-- 
cgit v0.10-9-g596f

