From 8a4f1385270d8d7700a90f0705683187a10a664f Mon Sep 17 00:00:00 2001
From: Ton Voon <tonvoon@users.sourceforge.net>
Date: Tue, 8 Jan 2008 16:05:36 +0000
Subject: Changed default test values for check_dns (using nagios.com)

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1902 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins/t/check_dns.t b/plugins/t/check_dns.t
index 6d81b21..fc89e6e 100644
--- a/plugins/t/check_dns.t
+++ b/plugins/t/check_dns.t
@@ -18,19 +18,19 @@ my $successOutput = '/DNS OK: [\.0-9]+ seconds? response time/';
 my $hostname_valid = getTestParameter( 
 			"NP_HOSTNAME_VALID",
 			"A valid (known to DNS) hostname",
-			"apple.com"
+			"nagios.com"
 			);
 
 my $hostname_valid_ip = getTestParameter(
 			"NP_HOSTNAME_VALID_IP",
 			"The IP address of the valid hostname $hostname_valid",
-			"17.254.3.183"
+			"66.118.156.50",
 			);
 
 my $hostname_valid_reverse = getTestParameter(
 			"NP_HOSTNAME_VALID_REVERSE",
 			"The hostname of $hostname_valid_ip",
-			$hostname_valid."."
+			"66-118-156-50.static.sagonet.net.",
 			);
 
 my $hostname_invalid = getTestParameter( 
-- 
cgit v0.10-9-g596f

