From 8d3562e126f4a0b8658abd91da27babf91acf2c6 Mon Sep 17 00:00:00 2001
From: Ton Voon <tonvoon@users.sourceforge.net>
Date: Tue, 2 May 2006 08:30:21 +0000
Subject: Inode thresholds not always being initialised (James Fidell -
 1476457)

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1388 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins/check_disk.c b/plugins/check_disk.c
index 1be5e6c..ef236c0 100644
--- a/plugins/check_disk.c
+++ b/plugins/check_disk.c
@@ -462,6 +462,8 @@ process_arguments (int argc, char **argv)
       se->c_df = c_df;
       se->w_dfp = w_dfp;
       se->c_dfp = c_dfp;
+      se->w_idfp = w_idfp;
+      se->c_idfp = c_idfp;
       se->found = 0;
       se->found_len = 0;
       *pathtail = se;
@@ -480,6 +482,8 @@ process_arguments (int argc, char **argv)
                         se->c_df = 0;
                         se->w_dfp = 0;
                         se->c_dfp = 0;
+			se->w_idfp = 0;
+			se->c_idfp = 0;
       se->found = 0;
       se->found_len = 0;
       *dptail = se;
@@ -497,6 +501,8 @@ process_arguments (int argc, char **argv)
                         se->c_df = 0;
                         se->w_dfp = 0;
                         se->c_dfp = 0;
+			se->w_idfp = 0;
+			se->c_idfp = 0;
       se->found = 0;
       se->found_len = 0;
       *fstail = se;
@@ -519,6 +525,8 @@ process_arguments (int argc, char **argv)
       c_df = 0;
       w_dfp = -1.0;
       c_dfp = -1.0;
+      w_idfp = -1.0;
+      c_idfp = -1.0;
       break;
     case 'V':                 /* version */
       print_revision (progname, revision);
@@ -547,6 +555,8 @@ process_arguments (int argc, char **argv)
     se->c_df = c_df;
     se->w_dfp = w_dfp;
     se->c_dfp = c_dfp;
+    se->w_idfp = w_idfp;
+    se->c_idfp = c_idfp;
     se->found =0;
     se->found_len = 0;
     *pathtail = se;
-- 
cgit v0.10-9-g596f

