From 8eebfe825c1ed18a02d8a89ad6c75637a4fd847b Mon Sep 17 00:00:00 2001
From: Ton Voon <tonvoon@users.sourceforge.net>
Date: Wed, 6 Aug 2003 20:53:34 +0000
Subject: Added in that Nagios plugins are written to GNU standards

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@652 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/doc/developer-guidelines.sgml b/doc/developer-guidelines.sgml
index 7ca9f96..6500297 100644
--- a/doc/developer-guidelines.sgml
+++ b/doc/developer-guidelines.sgml
@@ -91,8 +91,9 @@
 <article>
 <section id="DevRequirements"><title>Development platform requirements</title>
 	<para>
-	While the requirements for compiling the Nagios plugins release is very small,
-	to develop from CVS needs additional software to be installed. These are the 
+	Nagios plugins are developed to the GNU standard, so any OS which is supported by GNU
+	should run the plugins. While the requirements for compiling the Nagios plugins release 
+	is very small, to develop from CVS needs additional software to be installed. These are the 
 	minimum levels of software required:
 
 	<literallayout>
-- 
cgit v0.10-9-g596f

