From 93c1c1d84517f1d11a91636c4e045c9f2e8e279a Mon Sep 17 00:00:00 2001
From: Stanley Hopcroft <stanleyhopcroft@users.sourceforge.net>
Date: Wed, 2 Feb 2005 06:42:18 +0000
Subject: try again to stop looping

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1127 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins/check_ide_smart.c b/plugins/check_ide_smart.c
index bf12355..4172483 100644
--- a/plugins/check_ide_smart.c
+++ b/plugins/check_ide_smart.c
@@ -182,13 +182,10 @@ main (int argc, char *argv[])
 		
 		o = getopt_long (argc, argv, "+d:iq10nhV", longopts, &longindex);
 
-		switch (o) {
-		case -1: 
-								/* 
-								 * bail out of the switch but not the loop, so
-								 * that device can be extracted from argv.
-								 */
+		if (o == -1 || o == EOF || o == 1)
 			break;
+
+		switch (o) {
 		case 'd':
 			device = optarg;
 			break;
-- 
cgit v0.10-9-g596f

