From a69aa93a2c0305cb2168daba66b219c7de3bebde Mon Sep 17 00:00:00 2001
From: Thomas Guyot-Sionnest <dermoth@users.sourceforge.net>
Date: Mon, 29 Jan 2007 14:14:05 +0000
Subject: Revert 1643463 (reversed disk thresholds) keeping the thresholds
 checks.

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1594 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins/check_disk.c b/plugins/check_disk.c
index 476c892..99a7201 100644
--- a/plugins/check_disk.c
+++ b/plugins/check_disk.c
@@ -306,16 +306,16 @@ main (int argc, char **argv)
       critical_high_tide = UINT_MAX;
 
       if (path->freespace_units->warning != NULL) {
-        warning_high_tide = path->freespace_units->warning->end;
+        warning_high_tide = dtotal_units - path->freespace_units->warning->end;
       }
       if (path->freespace_percent->warning != NULL) {
-        warning_high_tide = abs( min( (double) warning_high_tide, (double) path->freespace_percent->warning->end/100*dtotal_units ));
+        warning_high_tide = abs( min( (double) warning_high_tide, (double) (1.0 - path->freespace_percent->warning->end/100)*dtotal_units ));
       }
       if (path->freespace_units->critical != NULL) {
-        critical_high_tide = path->freespace_units->critical->end;
+        critical_high_tide = dtotal_units - path->freespace_units->critical->end;
       }
       if (path->freespace_percent->critical != NULL) {
-        critical_high_tide = abs( min( (double) critical_high_tide, (double) path->freespace_percent->critical->end/100*dtotal_units ));
+        critical_high_tide = abs( min( (double) critical_high_tide, (double) (1.0 - path->freespace_percent->critical->end/100)*dtotal_units ));
       }
 
       asprintf (&perf, "%s %s", perf,
diff --git a/plugins/t/check_disk.t b/plugins/t/check_disk.t
index 7235d70..dd13ce5 100644
--- a/plugins/t/check_disk.t
+++ b/plugins/t/check_disk.t
@@ -82,9 +82,9 @@ $result = NPTest->testCmd(
         "./check_disk -w 20 -c 10 -p $mountpoint_valid"
         );
 $_ = $result->perf_output;
-my ($warn_absth_data, $crit_absth_data) = (m/=.[^;]*;(\d+);(\d+);\d+;\d+/);
-is ($warn_absth_data, 20, "Wrong warning in perf data using absolute thresholds");
-is ($crit_absth_data, 10, "Wrong critical in perf data using absolute thresholds");
+my ($warn_absth_data, $crit_absth_data, $total_absth_data) = (m/=.[^;]*;(\d+);(\d+);\d+;(\d+)/);
+is ($warn_absth_data, $total_absth_data - 20, "Wrong warning in perf data using absolute thresholds");
+is ($crit_absth_data, $total_absth_data - 10, "Wrong critical in perf data using absolute thresholds");
 
 # Then check percent thresholds.
 $result = NPTest->testCmd(
@@ -92,8 +92,8 @@ $result = NPTest->testCmd(
         );
 $_ = $result->perf_output;
 my ($warn_percth_data, $crit_percth_data, $total_percth_data) = (m/=.[^;]*;(\d+);(\d+);\d+;(\d+)/);
-is ($warn_percth_data, int($total_percth_data/100*20), "Wrong warning in perf data using percent thresholds");
-is ($crit_percth_data, int($total_percth_data/100*10), "Wrong critical in perf data using percent thresholds");
+is ($warn_percth_data, int((1-20/100)*$total_percth_data), "Wrong warning in perf data using percent thresholds");
+is ($crit_percth_data, int((1-10/100)*$total_percth_data), "Wrong critical in perf data using percent thresholds");
 
 
 # Check when order of mount points are reversed, that perf data remains same
-- 
cgit v0.10-9-g596f

