From a895bca1af8ce4cf4de923b3a43050283905b861 Mon Sep 17 00:00:00 2001
From: Karl DeBisschop <kdebisschop@users.sourceforge.net>
Date: Tue, 23 Mar 2004 06:35:44 +0000
Subject: check was supposed to be agains ms - got munged wfixeg the perfdata
 output to be in seconds

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@858 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins/check_fping.c b/plugins/check_fping.c
index dff7ff9..1a53677 100644
--- a/plugins/check_fping.c
+++ b/plugins/check_fping.c
@@ -263,7 +263,7 @@ process_arguments (int argc, char **argv)
 		case 'c':
 			get_threshold (optarg, rv);
 			if (rv[RTA]) {
-				crta = 1e-3 * strtod (rv[RTA], NULL);
+				crta = strtod (rv[RTA], NULL);
 				crta_p = TRUE;
 				rv[RTA] = NULL;
 			}
@@ -276,7 +276,7 @@ process_arguments (int argc, char **argv)
 		case 'w':
 			get_threshold (optarg, rv);
 			if (rv[RTA]) {
-				wrta = 1e-3 * strtod (rv[RTA], NULL);
+				wrta = strtod (rv[RTA], NULL);
 				wrta_p = TRUE;
 				rv[RTA] = NULL;
 			}
-- 
cgit v0.10-9-g596f

