From abc7b9b5be8e0192359486a2b41b9306d311feb0 Mon Sep 17 00:00:00 2001
From: Ton Voon <tonvoon@users.sourceforge.net>
Date: Mon, 24 Nov 2003 14:53:46 +0000
Subject: Bug from code-clean (Antony Simmonds - 846311)

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@777 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins/check_hpjd.c b/plugins/check_hpjd.c
index becbffe..8d3f4c8 100644
--- a/plugins/check_hpjd.c
+++ b/plugins/check_hpjd.c
@@ -132,7 +132,7 @@ main (int argc, char **argv)
 		temp_buffer = strtok (input_buffer, "=");
 		temp_buffer = strtok (NULL, "=");
 
-		if (temp_buffer != NULL) {
+		if (temp_buffer == NULL) {
 
 				result = STATE_UNKNOWN;
 				strcpy (errmsg, input_buffer);
-- 
cgit v0.10-9-g596f

