From ae3af0419bef68e5a01e825798af7493f45f8456 Mon Sep 17 00:00:00 2001
From: Thomas Guyot-Sionnest <dermoth@users.sourceforge.net>
Date: Wed, 13 Feb 2008 04:16:56 +0000
Subject: This floorf workaround is Nnot needed anymore since floorf is part of
 Gnulib

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1928 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins/common.h b/plugins/common.h
index 6cb7cd4..39a28a9 100644
--- a/plugins/common.h
+++ b/plugins/common.h
@@ -182,11 +182,6 @@ enum {
 };
 #endif
 
-/* Solaris does not have floorf, but floor works. Should probably be in configure */
-#if defined(__sun) || defined(__sun__)
-static inline float floorf (float x) { return floor(x); }
-#endif
-
 enum {
 	STATE_OK,
 	STATE_WARNING,
-- 
cgit v0.10-9-g596f

