From b19f0704f31e0a7cd2d1302e964efa2b038cfae7 Mon Sep 17 00:00:00 2001
From: Holger Weiss <hweiss@users.sourceforge.net>
Date: Tue, 3 Apr 2007 17:19:04 +0000
Subject: Fix the synchronization source selection on big-endian systems.

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1675 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins/check_ntp.c b/plugins/check_ntp.c
index cf63eea..30e5890 100644
--- a/plugins/check_ntp.c
+++ b/plugins/check_ntp.c
@@ -138,8 +138,8 @@ typedef struct {
 #define OP_SET(x,y)   do{ x |= (y&OP_MASK); }while(0)
 #define OP_READSTAT 0x01
 #define OP_READVAR  0x02
-/* In peer status bytes, bytes 6,7,8 determine clock selection status */
-#define PEER_SEL(x) (x&0x07)
+/* In peer status bytes, bits 6,7,8 determine clock selection status */
+#define PEER_SEL(x) ((ntohs(x)>>8)&0x07)
 #define PEER_INCLUDED 0x04
 #define PEER_SYNCSOURCE 0x06
 
-- 
cgit v0.10-9-g596f

