From b5b77ce39eb67ac83ee0c7c18f7020607c8abee1 Mon Sep 17 00:00:00 2001
From: Ton Voon <tonvoon@users.sourceforge.net>
Date: Fri, 4 Mar 2005 22:20:17 +0000
Subject: Ignore extra check on offset 0.00000 (John Warburton - 1150777)

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1148 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins-scripts/check_ntp.pl b/plugins-scripts/check_ntp.pl
index cd02d47..8b5fe4d 100755
--- a/plugins-scripts/check_ntp.pl
+++ b/plugins-scripts/check_ntp.pl
@@ -216,7 +216,9 @@ while (<NTPDATE>) {
 
 		# An offset of 0.000000 with an error is probably bogus. Actually,
 		# it's probably always bogus, but let's be paranoid here.
-		if ($offset == 0) { undef $offset;}
+		# Has been reported that 0.0000 happens in a production environment
+		# so this check should be taken out - SF tracker 1150777
+		#if ($offset == 0) { undef $offset;}
 
 		$ntpdate_error = defined ($offset) ? $ERRORS{"OK"} : $ERRORS{"CRITICAL"};
 		print "ntperr = $ntpdate_error \n" if $verbose;
-- 
cgit v0.10-9-g596f

