From bb5ce4be01810300d9dbffc72eb07364dd18e379 Mon Sep 17 00:00:00 2001
From: Ton Voon <tonvoon@users.sourceforge.net>
Date: Mon, 25 Aug 2008 13:26:11 +0000
Subject: Updated with more tests re: multiple status codes (Sven Nierlein)

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@2047 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins/tests/check_http.t b/plugins/tests/check_http.t
index e4d770b..a4a45cb 100755
--- a/plugins/tests/check_http.t
+++ b/plugins/tests/check_http.t
@@ -60,7 +60,7 @@ if ($ARGV[0] && $ARGV[0] eq "-d") {
 }
 
 if (-x "./check_http") {
-	plan tests => 15;
+	plan tests => 19;
 } else {
 	plan skip_all => "No check_http compiled";
 }
@@ -106,3 +106,13 @@ $result = NPTest->testCmd( $cmd );
 is( $result->return_code, 0, $cmd);
 like( $result->output, '/^HTTP OK HTTP/1.1 200 OK - 89 bytes in ([\d\.]+) seconds/', "Output correct: ".$result->output );
 
+$cmd = "$command -u /statuscode/201 -e 200,201,202";
+$result = NPTest->testCmd( $cmd );
+is( $result->return_code, 0, $cmd);
+like( $result->output, '/^HTTP OK HTTP/1.1 201 Created - 94 bytes in ([\d\.]+) seconds/', "Output correct: ".$result->output );
+
+$cmd = "$command -u /statuscode/203 -e 200,201,202";
+$result = NPTest->testCmd( $cmd );
+is( $result->return_code, 2, $cmd);
+like( $result->output, '/^HTTP CRITICAL - Invalid HTTP response received from host on port (\d+): HTTP/1.1 203 Non-Authoritative Information/', "Output correct: ".$result->output );
+
-- 
cgit v0.10-9-g596f

