From c2be722c8592d416570c1a2aff4778042ebb5422 Mon Sep 17 00:00:00 2001
From: Subhendu Ghosh <sghosh@users.sourceforge.net>
Date: Wed, 8 May 2002 04:58:22 +0000
Subject: moved updated check_ifstatus to standard plugin

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@23 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins-scripts/Makefile.am b/plugins-scripts/Makefile.am
index 4bdf717..e753a8b 100644
--- a/plugins-scripts/Makefile.am
+++ b/plugins-scripts/Makefile.am
@@ -6,11 +6,11 @@ VPATH=$(top_srcdir) $(top_srcdir)/plugins-scripts $(top_srcdir)/plugins-scripts/
 
 libexec_SCRIPTS = check_breeze check_disk_smb check_flexlm check_ircd \
 	check_log check_ntp check_oracle check_rpc check_sensors check_wave \
-	utils.sh utils.pm
+	check_ifstatus utils.sh utils.pm
 
 EXTRA_DIST=check_breeze.pl check_disk_smb.pl check_flexlm.pl check_ircd.pl \
 	check_log.sh check_ntp.pl check_oracle.sh check_rpc.pl check_sensors.sh \
-	check_wave.pl utils.sh.in utils.pm.in t
+	check_ifstatus.pl check_wave.pl utils.sh.in utils.pm.in t
 
 TESTS_ENVIRONMENT=perl -I $(top_builddir) -I $(top_srcdir)
 
diff --git a/plugins-scripts/check_ifstatus.pl b/plugins-scripts/check_ifstatus.pl
new file mode 100755
index 0000000..f54008f
--- /dev/null
+++ b/plugins-scripts/check_ifstatus.pl
@@ -0,0 +1,250 @@
+#!/usr/local/bin/perl -w
+#
+# check_ifstatus.pl - nagios plugin 
+# 
+#
+# Copyright (C) 2000 Christoph Kron
+# Modified 5/2002 to conform to updated Nagios Plugin Guidelines (S. Ghosh)
+#
+# This program is free software; you can redistribute it and/or
+# modify it under the terms of the GNU General Public License
+# as published by the Free Software Foundation; either version 2
+# of the License, or (at your option) any later version.
+#
+# This program is distributed in the hope that it will be useful,
+# but WITHOUT ANY WARRANTY; without even the implied warranty of
+# MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
+# GNU General Public License for more details.
+#
+# You should have received a copy of the GNU General Public License
+# along with this program; if not, write to the Free Software
+# Foundation, Inc., 59 Temple Place - Suite 330, Boston, MA  02111-1307, USA.
+#
+#
+# Report bugs to: ck@zet.net, nagiosplug-help@lists.sf.net
+# 
+# 11.01.2000 Version 1.0
+#
+# $Id$
+
+use POSIX;
+use strict;
+use lib utils.pm ;
+use utils qw($TIMEOUT %ERRORS &print_revision &support);
+
+use Net::SNMP;
+use Getopt::Long;
+Getopt::Long::Configure('bundling');
+
+my $PROGNAME = "check_ifstatus";
+
+
+my $status;
+my %ifOperStatus = 	('1','up',
+			 '2','down',
+			 '3','testing',
+			 '4','unknown',
+			 '5','dormant',
+			 '6','notPresent');
+
+my $state = "UNKNOWN";
+my $answer = "";
+my $snmpkey=0;
+my $snmpoid=0;
+my $key=0;
+my $community = "public";
+my $port = 161;
+my @snmpoids;
+my $snmpIfAdminStatus = '1.3.6.1.2.1.2.2.1.7';
+my $snmpIfDescr = '1.3.6.1.2.1.2.2.1.2';
+my $snmpIfOperStatus = '1.3.6.1.2.1.2.2.1.8';
+my $snmpIfName = '1.3.6.1.2.1.31.1.1.1.1';
+my $snmpIfAlias = '1.3.6.1.2.1.31.1.1.1.18';
+my $snmpLocIfDescr = '1.3.6.1.4.1.9.2.2.1.1.28';
+my $hostname;
+my $session;
+my $error;
+my $response;
+my %ifStatus;
+my $ifup =0 ;
+my $ifdown =0;
+my $ifdormant = 0;
+my $ifmessage = "";
+my $snmp_version = 1;
+my $ifXTable;
+my $opt_h ;
+my $opt_V ;
+
+
+
+
+
+# Just in case of problems, let's not hang Nagios
+$SIG{'ALRM'} = sub {
+     print ("ERROR: No snmp response from $hostname (alarm timeout)\n");
+     exit $ERRORS{"UNKNOWN"};
+};
+alarm($TIMEOUT);
+
+
+
+#Option checking
+$status = GetOptions(
+		"V"   => \$opt_V, "version"    => \$opt_V,
+		"h"   => \$opt_h, "help"       => \$opt_h,
+		"v=i" => \$snmp_version, "snmp_version=i"  => \$snmp_version,
+		"C=s" =>\$community,"community=s" => \$community,
+		"p=i" =>\$port, "port=i" => \$port,
+		"H=s" => \$hostname, "hostname=s" => \$hostname,
+		"I"	  => \$ifXTable, "ifmib" => \$ifXTable );
+		
+if ($status == 0)
+{
+	print_help() ;
+	exit $ERRORS{'OK'};
+}
+
+
+if ($opt_V) {
+	print_revision($PROGNAME,'$Revision$ ');
+	exit $ERRORS{'OK'};
+}
+
+if ($opt_h) {
+	print_help();
+	exit $ERRORS{'OK'};
+}
+
+if (! utils::is_hostname($hostname)){
+	usage();
+	exit $ERRORS{"UNKNOWN"};
+}
+
+if ( ! $snmp_version ) {
+	$snmp_version =1 ;
+}else{
+	if ( $snmp_version =~ /[12]/ ) {
+			
+		($session, $error) = Net::SNMP->session(
+		      -hostname  => $hostname,
+		      -community => $community,
+		      -port      => $port,
+			  -version	=> $snmp_version
+			   );
+
+		if (!defined($session)) {
+		      $state='UNKNOWN';
+		      $answer=$error;
+		      print ("$state: $answer");
+		      exit $ERRORS{$state};
+		}
+
+		
+	}elsif ( $snmp_version =~ /3/ ) {
+		$state='UNKNOWN';
+		print ("$state: No support for SNMP v3 yet\n");
+		exit $ERRORS{$state};
+	}else{
+		$state='UNKNOWN';
+		print ("$state: No support for SNMP v$snmp_version yet\n");
+		exit $ERRORS{$state};
+	}
+}
+
+
+
+push(@snmpoids,$snmpIfOperStatus);
+push(@snmpoids,$snmpIfAdminStatus);
+push(@snmpoids,$snmpIfDescr);
+push(@snmpoids,$snmpIfName) if ( defined $ifXTable);
+
+
+
+foreach $snmpoid (@snmpoids) {
+
+   if (!defined($response = $session->get_table($snmpoid))) {
+      $answer=$session->error;
+      $session->close;
+      $state = 'CRITICAL';
+      print ("$state: $answer for $snmpoid  with snmp version $snmp_version\n");
+      exit $ERRORS{$state};
+   }
+
+   foreach $snmpkey (keys %{$response}) {
+      $snmpkey =~ /.*\.(\d+)$/;
+      $key = $1;
+      $ifStatus{$key}{$snmpoid} = $response->{$snmpkey};
+   }
+}
+
+
+$session->close;
+
+foreach $key (keys %ifStatus) {
+
+	# check only if interface is administratively up
+    if ($ifStatus{$key}{$snmpIfAdminStatus} == 1 ) {
+    	if ($ifStatus{$key}{$snmpIfOperStatus} == 1 ) { $ifup++ ;}
+        if ($ifStatus{$key}{$snmpIfOperStatus} == 2 ) {
+             $ifdown++ ;
+             $ifmessage .= sprintf("%s: down -> %s<BR>",
+                                 $ifStatus{$key}{$snmpIfDescr},
+								 $ifStatus{$key}{$snmpIfName});
+
+         }
+         if ($ifStatus{$key}{$snmpIfOperStatus} == 5 ) { $ifdormant++ ;}
+      }
+   }
+   
+
+   if ($ifdown > 0) {
+      $state = 'CRITICAL';
+      $answer = sprintf("host '%s', interfaces up: %d, down: %d, dormant: %d<BR>",
+                        $hostname,
+			$ifup,
+			$ifdown,
+			$ifdormant);
+      $answer = $answer . $ifmessage . "\n";
+   }
+   else {
+      $state = 'OK';
+      $answer = sprintf("host '%s', interfaces up: %d, down: %d, dormant: %d\n",
+                        $hostname,
+			$ifup,
+			$ifdown,
+			$ifdormant);
+   }
+
+print ("$state: $answer");
+exit $ERRORS{$state};
+
+
+sub usage {
+	printf "\nMissing arguments!\n";
+	printf "\n";
+	printf "check_ifstatus -C <READCOMMUNITY> -p <PORT> -H <HOSTNAME>\n";
+	printf "Copyright (C) 2000 Christoph Kron\n";
+	printf "Updates 5/2002 Subhendu Ghosh\n";
+	printf "\n\n";
+	support();
+	exit $ERRORS{"UNKNOWN"};
+}
+
+sub print_help {
+	printf "check_ifstatus plugin for Nagios monitors operational \n";
+  	printf "status of each network interface on the target host\n";
+	printf "\nUsage:\n";
+	printf "   -H (--hostname)   Hostname to query - (required)\n";
+	printf "   -C (--community)  SNMP read community (defaults to public,\n";
+	printf "                     used with SNMP v1 and v2c\n";
+	printf "   -v (--snmp_version)  1 for SNMP v1 (default)\n";
+	printf "                        2 for SNMP v2c\n";
+	printf "                        SNMP v2c will use get_bulk for less overhead\n";
+	printf "   -p (--port)       SNMP port (default 161)\n";
+	printf "   -I (--ifmib)      Agent supports IFMIB ifXTable.  Do not use if\n";
+	printf "                     you don't know what this is.\n";
+	printf "   -V (--version)    Plugin version\n";
+	printf "   -h (--help)       usage help \n\n";
+	print_revision($PROGNAME, '$Revision$');
+	
+}
-- 
cgit v0.10-9-g596f

