From c3c528952d593dea59c2b6dcee05bab625db307a Mon Sep 17 00:00:00 2001
From: Thomas Guyot-Sionnest <dermoth@solaris.beaubien.net>
Date: Mon, 16 Mar 2009 18:49:51 -0500
Subject: Fix check_snmp test on solaris


diff --git a/plugins/t/check_snmp.t b/plugins/t/check_snmp.t
index c2c965d..6d3dcb4 100644
--- a/plugins/t/check_snmp.t
+++ b/plugins/t/check_snmp.t
@@ -94,7 +94,7 @@ SKIP: {
 		skip "no non invalid host defined", 2 if ( ! $hostname_invalid );
 		$res = NPTest->testCmd( "./check_snmp -H $hostname_invalid   -C $snmp_community -o system.sysUpTime.0 -w 1: -c 1:");
 		cmp_ok( $res->return_code, '==', 3, "Exit UNKNOWN with non responsive host" ); 
-		like($res->output, '/External command error: .*(nosuchhost|Name or service not known)/', "String matches invalid host");
+		like($res->output, '/External command error: .*(nosuchhost|Name or service not known|Unknown host)/', "String matches invalid host");
 	}
 
 }
-- 
cgit v0.10-9-g596f

