From c49fed07c3837fb7590bd05d192d6b6f6c4ae5d4 Mon Sep 17 00:00:00 2001
From: Thomas Guyot-Sionnest <dermoth@aei.ca>
Date: Tue, 30 Nov 2010 23:57:04 -0500
Subject: Fix minor test issues

My Test::More wouldn't print the total number of tests anymore, moving
the plan at the top appears to fix it.

At the same time I made check-http.t eval the special modules so it can
skip the tests instead of failing.

diff --git a/plugins/tests/check_http.t b/plugins/tests/check_http.t
index f03933b..74eff17 100755
--- a/plugins/tests/check_http.t
+++ b/plugins/tests/check_http.t
@@ -18,9 +18,24 @@ use Test::More;
 use NPTest;
 use FindBin qw($Bin);
 
-use HTTP::Daemon;
-use HTTP::Status;
-use HTTP::Response;
+my $common_tests = 66;
+my $ssl_only_tests = 6;
+# Check that all dependent modules are available
+eval {
+	require HTTP::Daemon;
+	require HTTP::Status;
+	require HTTP::Response;
+};
+
+if ($@) {
+	plan skip_all => "Missing required module for test: $@";
+} else {
+	if (-x "./check_http") {
+		plan tests => $common_tests * 2 + $ssl_only_tests;
+	} else {
+		plan skip_all => "No check_http compiled";
+	}
+}
 
 my $servers = { http => 0 };	# HTTP::Daemon should always be available
 eval { require HTTP::Daemon::SSL };
@@ -112,9 +127,9 @@ sub run_server {
 				$c->send_response("slow");
 			} elsif ($r->url->path eq "/method") {
 				if ($r->method eq "DELETE") {
-					$c->send_error(RC_METHOD_NOT_ALLOWED);
+					$c->send_error(HTTP::Status->RC_METHOD_NOT_ALLOWED);
 				} elsif ($r->method eq "foo") {
-					$c->send_error(RC_NOT_IMPLEMENTED);
+					$c->send_error(HTTP::Status->RC_NOT_IMPLEMENTED);
 				} else {
 					$c->send_status_line(200, $r->method);
 				}
@@ -138,7 +153,7 @@ sub run_server {
 				delete($persist[1000]);
 				next MAINLOOP;
 			} else {
-				$c->send_error(RC_FORBIDDEN);
+				$c->send_error(HTTP::Status->RC_FORBIDDEN);
 			}
 			$c->close;
 		}
@@ -157,14 +172,6 @@ if ($ARGV[0] && $ARGV[0] eq "-d") {
 	}
 }
 
-my $common_tests = 66;
-my $ssl_only_tests = 6;
-if (-x "./check_http") {
-	plan tests => $common_tests * 2 + $ssl_only_tests;
-} else {
-	plan skip_all => "No check_http compiled";
-}
-
 my $result;
 my $command = "./check_http -H 127.0.0.1";
 
diff --git a/plugins/tests/check_snmp.t b/plugins/tests/check_snmp.t
index c960f7b..b978a85 100755
--- a/plugins/tests/check_snmp.t
+++ b/plugins/tests/check_snmp.t
@@ -8,6 +8,7 @@ use Test::More;
 use NPTest;
 use FindBin qw($Bin);
 
+my $tests = 39;
 # Check that all dependent modules are available
 eval {
 	require NetSNMP::OID;
@@ -17,6 +18,12 @@ eval {
 
 if ($@) {
 	plan skip_all => "Missing required module for test: $@";
+} else {
+	if (-x "./check_snmp") {
+		plan tests => $tests;
+	} else {
+		plan skip_all => "No check_snmp compiled";
+	}
 }
 
 my $port_snmp = 16100 + int(rand(100));
@@ -54,13 +61,6 @@ if ($ARGV[0] && $ARGV[0] eq "-d") {
 # We should merge that with $ENV{'NPTEST_CACHE'}, use one dir for all test data
 $ENV{'NAGIOS_PLUGIN_STATE_DIRECTORY'} ||= "/var/tmp";
 
-my $tests = 39;
-if (-x "./check_snmp") {
-	plan tests => $tests;
-} else {
-	plan skip_all => "No check_snmp compiled";
-}
-
 my $res;
 
 $res = NPTest->testCmd( "./check_snmp -H 127.0.0.1 -C public -p $port_snmp -o .1.3.6.1.4.1.8072.3.2.67.0");
-- 
cgit v0.10-9-g596f

