From c6073a9b6b559fdf22bf1c6debce9345f2d3e05c Mon Sep 17 00:00:00 2001
From: "M. Sean Finney" <seanius@users.sourceforge.net>
Date: Thu, 14 Apr 2005 04:07:24 +0000
Subject: typographical fix in check_ntp

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1161 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins-scripts/check_ntp.pl b/plugins-scripts/check_ntp.pl
index 82c97ce..20780b5 100755
--- a/plugins-scripts/check_ntp.pl
+++ b/plugins-scripts/check_ntp.pl
@@ -443,7 +443,7 @@ Checks the jitter/dispersion of clock signal between <host> and its sys.peer wit
 -j (--jwarn)
      Clock jitter in milliseconds at which a warning message will be generated.\n	Defaults to $DEFAULT_JITTER_WARN.
 -k (--jcrit)
-    Clock jitter in milliseconds at which a warning message will be generated.\n	Defaults to $DEFAULT_JITTER_CRIT.
+    Clock jitter in milliseconds at which a critical message will be generated.\n	Defaults to $DEFAULT_JITTER_CRIT.
     
     If jitter/dispersion is specified with -j or -k and ntpq times out, then a
     warning is returned.\n
-- 
cgit v0.10-9-g596f

