From c8558c620c73715e68c3c9912339c5bc831e8559 Mon Sep 17 00:00:00 2001
From: Thomas Guyot-Sionnest <dermoth@users.sourceforge.net>
Date: Thu, 10 Jul 2008 10:03:43 +0000
Subject: Typo in check_ups

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@2023 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins/check_ups.c b/plugins/check_ups.c
index 773da5f..154508d 100644
--- a/plugins/check_ups.c
+++ b/plugins/check_ups.c
@@ -635,7 +635,7 @@ print_help (void)
 	printf ("%s\n", _("This plugin attempts to determine the status of a UPS (Uninterruptible Power"));
   printf ("%s\n", _("Supply) on a local or remote host. If the UPS is online or calibrating, the"));
   printf ("%s\n", _("plugin will return an OK state. If the battery is on it will return a WARNING"));
-  printf ("%s\n", _("state.If the UPS is off or has a low battery the plugin will return a CRITICAL"));
+  printf ("%s\n", _("state. If the UPS is off or has a low battery the plugin will return a CRITICAL"));
   printf ("%s\n", _("state."));
 
   printf ("\n");
-- 
cgit v0.10-9-g596f

