From ca109dc7ed7fd3093f267d4a19fe49f073476356 Mon Sep 17 00:00:00 2001
From: Stanley Hopcroft <stanleyhopcroft@users.sourceforge.net>
Date: Wed, 24 Nov 2004 06:36:13 +0000
Subject: add -OQa to command_line in check_hpjd.c. Correct
 nagiosplug-Bugs-889948, 846329

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@933 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins/check_hpjd.c b/plugins/check_hpjd.c
index b124cce..5699570 100644
--- a/plugins/check_hpjd.c
+++ b/plugins/check_hpjd.c
@@ -103,7 +103,7 @@ main (int argc, char **argv)
 		 HPJD_GD_DOOR_OPEN, HPJD_GD_PAPER_OUTPUT, HPJD_GD_STATUS_DISPLAY);
 
 	/* get the command to run */
-	sprintf (command_line, "%s -m : -v 1 -c %s %s %s", PATH_TO_SNMPGET, community, 
+	sprintf (command_line, "%s -OQa -m : -v 1 -c %s %s %s", PATH_TO_SNMPGET, community, 
 									address, query_string);
 
 	/* run the command */
-- 
cgit v0.10-9-g596f

