From d3af657e468065dcbae73e6a7289f7090822bacd Mon Sep 17 00:00:00 2001
From: Karl DeBisschop <kdebisschop@users.sourceforge.net>
Date: Sat, 9 Nov 2002 03:16:14 +0000
Subject: HAVE_C99_SNPRINTF is not tested, so remove from ifdef

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@177 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins/snprintf.c b/plugins/snprintf.c
index ef1d254..3de2a96 100644
--- a/plugins/snprintf.c
+++ b/plugins/snprintf.c
@@ -789,7 +789,7 @@ static void dopr_outch(char *buffer, size_t *currlen, size_t maxlen, char c)
  * these should really be smb_snprintf to avoid conflicts with buggy
  * linkers? -- mbp
  */
-#if !defined(HAVE_SNPRINTF) || !defined(HAVE_C99_SNPRINTF)
+#if !defined(HAVE_SNPRINTF) /* || !defined(HAVE_C99_SNPRINTF) */
  int snprintf(char *str,size_t count,const char *fmt,...)
 {
 	size_t ret;
-- 
cgit v0.10-9-g596f

