From e340b0db7378741bd956409c7f1cda599f159a11 Mon Sep 17 00:00:00 2001
From: Ton Voon <tonvoon@users.sourceforge.net>
Date: Tue, 7 Mar 2006 10:33:00 +0000
Subject: Added tests for two external websites with certificates

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@1321 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/plugins/t/check_http.t b/plugins/t/check_http.t
index 598a423..9b90fd0 100644
--- a/plugins/t/check_http.t
+++ b/plugins/t/check_http.t
@@ -25,7 +25,7 @@ my $hostname_invalid   = getTestParameter( "NP_HOSTNAME_INVALID",
 		"An invalid (not known to DNS) hostname",  
 		"nosuchhost");
 
-plan tests => 6;
+plan tests => 8;
 
 
 $res = NPTest->testCmd(
@@ -46,3 +46,12 @@ $res = NPTest->testCmd(
 cmp_ok( $res->return_code, '==', 2, "Webserver $hostname_invalid not valid" );
 like( $res->output, "/Name or service not known.*/", "Output OK");
 
+$res = NPTest->testCmd(
+	"./check_http --ssl www.verisign.com"
+	);
+cmp_ok( $res->return_code, '==', 0, "Can read https for www.verisign.com" );
+
+$res = NPTest->testCmd(
+	"./check_http --ssl www.e-paycobalt.com"
+	);
+cmp_ok( $res->return_code, "==", 0, "Can read https for www.e-paycobalt.com (uses AES certificate)" );
-- 
cgit v0.10-9-g596f

