From e47b74ede50b0f4feabda65f5c33fee6da13c136 Mon Sep 17 00:00:00 2001
From: Ton Voon <tonvoon@users.sourceforge.net>
Date: Tue, 16 Sep 2003 12:32:13 +0000
Subject: AIX problem with enum TRUE and FALSE (Ludse Verhoeven)

git-svn-id: https://nagiosplug.svn.sourceforge.net/svnroot/nagiosplug/nagiosplug/trunk@730 f882894a-f735-0410-b71e-b25c423dba1c

diff --git a/AUTHORS b/AUTHORS
index a92db2d..fcf612a 100644
--- a/AUTHORS
+++ b/AUTHORS
@@ -82,3 +82,4 @@ Eric Bollengier
 Edwin Eefting
 Peter Hoogendijk
 Kjell Sundtjonn
+Ludse Verhoeven
diff --git a/plugins/common.h b/plugins/common.h
index 372e59a..0c21fbe 100644
--- a/plugins/common.h
+++ b/plugins/common.h
@@ -139,10 +139,13 @@ enum {
 	ERROR = -1
 };
 
+/* AIX seems to have this defined somewhere else */
+#ifndef FALSE
 enum {
 	FALSE,
 	TRUE
 };
+#endif
 
 enum {
 	STATE_OK,
-- 
cgit v0.10-9-g596f

